使用这些按钮为指定的分辨率和刷新率调整监视器屏幕的位置。


使用这些按钮为指定的分辨率和刷新率调整监视器屏幕的大小。

注：调整屏幕大小会稍稍改变实际的刷新率。若使用的是固定频率的监视器，请从监视器文档中查阅有关刷新率容差的信息。


为指定的分辨率和刷新率更改监视器同步信号的极性。

若默认设置无法取得满意的显示效果，可以尝试更改这些设置。


单击此按钮以撤消为指定的分辨率和刷新率所做的最后一次更改（即当您单击“应用”时进行的更改）。


单击此按钮以便为指定的分辨率和刷新率将“监视器调整”设置为制造商的默认设置。


若选定此复选框，在拖动任何一个滑块时，三个滑块都一起移动。


在屏幕表面产生的亮度与输入电压的γ次幂（γ为灰度系数）成正比。这种非线性必须进行补偿以便正确地重现图象的亮度。屏幕灰度系数的作用是加深明暗区域之间的中间色调。灰度系数校正的调整会影响整个屏幕的显示。灰度系数校正可能的设置范围为 0.3 - 4.0。

单击“>1<”按钮将默认设置设定为 1.0。

灰度系数校正的调整不能用于 256 色模式。


只有当前指派给您的工作桌面的那些监视器可以更改这些设置。