Schaltflächen für die Feinabstimmung der Bildposition auf dem Monitor für die angezeigte Auflösung und Wiederholrate.


Schaltflächen für die Feinabstimmung der Bildgrösse auf dem Monitor für die angezeigte Auflösung und Wiederholrate.

HINWEIS: Bei einer Änderung der Bildgrösse verändert sich die tatsächliche Bildwiederholrate geringfügig. Wenn Sie einen Festfrequenz-Monitor betreiben, informieren Sie sich bitte anhand der Monitor-Dokumentation über die Toleranzen der Bildwiederholrate.


Ändert die Polarität des Sync Signals für die angezeigte Auflösung und Wiederholrate.

Wenn Sie mit der Standardeinstellung kein zufriedenstellendes Bild erhalten, können Sie versuchen, ob es besser wird, wenn Sie diese Einstellungen zu ändern.


Klicken Sie auf diese Schaltfläche um Ihre letzten Änderungen (d.h. seit Sie ‘Übernehmen‘ gedrückt haben) für die angezeigte Auflösung und Wiederholrate rückgängig zu machen.


Klicken Sie auf diese Schaltfläche um bei der ‘Monitor Abstimmung’, für die angezeigte Auflösung und Wiederholrate, die Standardeinstellung des Herstellers zu setzen.


Wenn Sie diese Funktion anwählen, werden beim Bewegen eines Schiebereglers alle drei Regler gemeinsam bewegt.


Die Bildschirmhelligkeit ist proportional zur angelegten Spannung hoch Gamma. Diese Nicht-Linearität muss kompensiert werden, damit die Helligkeitswerte eines Bildes korrekt wiedergegeben werden. Der Bildschirm-Gammaeffekt bewirkt, dass Mitteltöne im Verhältnis zu dunklen und hellen Bereichen zu dunkel dargestellt werden.

Das Einstellen der Gamma-Korrektur beeinflusst die gesamte Bildschirmdarstellung. Einstellungen von 0.3 bis 4.0 sind möglich.

Zum Einstellen des Standardwertes 1.0 klicken Sie auf die Schaltflächen “>1<”

Gamma Korrektur ist bei 256-Farben-Modi nicht möglich.


Sie können die Einstellungen nur für die Monitore ändern, die Sie Ihrem Arbeitsplatz aktuell zugewiesen haben.