Utilisez ces boutons pour ajuster la position de l’écran du moniteur de façon à obtenir la résolution et le taux de rafraîchissement indiqués.


Utilisez ces boutons pour ajuster la taille de l’écran du moniteur de façon à obtenir la résolution et le taux de rafraîchissement indiqués.

REMARQUE : le redimensionnement de l’écran modifie légèrement le taux de rafraîchissement réel. Si vous utilisez un moniteur à fréquence fixe, consultez la documentation de votre moniteur pour connaître les tolérances concernant les taux de rafraîchissement.


Change la polarité des signaux sync du moniteur par rapport à la résolution et au taux de rafraîchissement indiqués.

Si vous n’obtenez pas un affichage satisfaisant avec les paramètres par défaut, vous pouvez essayer de les modifier.


Cliquez sur ce bouton pour annuler les dernières modifications que vous avez effectuées (par exemple lorsque vous avez cliqué sur ‘Appliquer’ ) sur la résolution et le taux de rafraîchissement indiqués..


Cliquez sur ce bouton pour définir l’option ‘Monitor Tuning’ (Réglages du moniteur) de façon à redonner à la résolution et au taux de rafraîchissement indiqués leurs valeurs paramétrées en usine.


Si vous cochez cette case, les trois curseurs se déplacent ensemble lorsque vous faites glisser l’un d’entre eux.


La luminosité produite par l’écran est proportionnelle à la tension d’entrée élevée à la puissance gamma. Cette non-linéarité doit être compensée pour obtenir une reproduction correcte de la luminosité de l’image. Le gamma d’affichage a pour effet d’assombrir les tons médians par rapport aux zones foncées et lumineuses. L’ajustement de la correction gamma affecte l’intégralité de l’affichage. La plage de paramètres possibles va de 0,3 à 4,0.

Cliquez sur le bouton “>1<” pour définir le paramètre par défaut de 1,0.

L’ajustement de la correction gamma ne peut être utilisé dans le mode 256 couleurs.


Vous pouvez modifier ces paramètres uniquement pour les moniteurs couramment affectés à votre station de travail.