これらのボタンを使用して、現在選択されている解像度およびリフレッシュレートについて、表示位置を調整できます。


これらのボタンを使用して、現在選択されている解像度およびリフレッシュレートについて、表示位置を調整できます。

備考: 画面の調整を行うと実際のリフレッシュ・レートは微妙に変化します。この操作を行うにあたっては、ご使用になられているモニタのマニュアルなどを参照し、リフレッシュ・レートの許容範囲を確認してください。


現在選択されている解像度およびリフレッシュレートについて、同期信号の極性を変更できます。

デフォルト設定で不都合がある場合、これらの設定を変更してみてください。


このボタンを押すと最後に操作した内容を無効にできます。


このボタンをクリックすると「モニタ調整」の各項目はデフォルトに設定されます。


このボタンをチェックすると、３つのスライダを同時に操作することができます。


画面上で再生される明るさは、入力電圧のガンマ乗に比例します。画像の明るさを正確に再生するには、このガンマ曲線を補正する必要があります。ガンマ値を上げると、明るい部分と暗い部分に対して中間的な明るさの部分が相対的に暗くなります。ガンマ補正の調整は画面表示全体に影響します。設定できる値の範囲は、 0.3 から 4.0です。

�>1<�ボタンをクリックするとデフォルトの1.0に設定されます。

ガンマ・コレクションは256色モードでは使用できません。


現在デスクトップにアサインされているモニタのみ変更可能です。