Bruk disse knappene til å justere posisjonen for skjermbildet i forhold til valgt oppløsning og oppdateringsfrekvens.


Bruk disse knappene til å justere størrelsen på skjermbildet i forhold til valgt oppløsning og oppdateringsfrekvens.

MERK: Ved mindre endringer i skjermbildestørrelsen endres den faktiske oppdateringsfrekvensen. Hvis du bruker en skjerm med fast frekvens, må du se i dokumentasjonen for skjermen for å få informasjon om hvilke oppdateringsfrekvenser som kan brukes.


Endrer polariteten for skjermsynkroniseringssignalene i forhold til valgt oppløsning og oppdateringsfrekvens.

Hvis du ikke får tilfredsstillende visning med standardinnstillingene, kan du prøve å endre disse innstillingene.


Klikk denne knappen hvis du vil angre de siste endringene du utførte (dvs. da du klikket på ‘Bruk’ ) for valgt oppløsning og oppdateringsfrekvens.


Klikk denne knappen hvis du vil sette ‘Skjermjustering’ for valgt oppløsning og oppdateringsfrekvens til produsentens standardinnstillinger.


Når det er merket av i denne boksen, flyttes de tre skyverne sammen når du drar en av dem.


Lysstyrken som genereres på fronten av skjermen, er proporsjonal med inngangsspenningen opphøyd i gamma-potens. Denne ikke-lineariteten må kompenseres for å få riktig gjengivelse av lysstyrken på skjermen. Skjermgammaen virker slik at den formørker mellomtonene i forhold til de mørke og lyse områdene. Justering av gammakorreksjonen påvirker hele skjermvisningen. Området for mulige innstillinger er 0.3 - 4.0.

Klikk “>1<” hvis du vil velge standardinnstillingen, som er 1.0.

Justering av gammakorreksjonen kan ikke utføres i 256-fargers modus.


Du kan bare endre disse innstillingene for skjermene som for øyeblikket er tilordnet til skrivebordet du bruker.