Viser en liste over tilgængelige konfigurationsprofiler.

Det aktuelle valg er aktivt.


Føj en ny konfigurationsprofil til listen.

Indstillingen for det aktuelle valg kopieres.


Slet den aktuelle konfiguration fra profillisten.


Rediger indstillingerne for den aktuelt valgte konfigurationsprofil.


Angiv, at der skal bruges 4-bit dobbelt buffered eller 8-bit enkelt buffered for hver 32-bit pixel i billedbufferen.


Brug blit-kopiering fra bageste til forreste buffer.


Buffer swap synkroniseret med den vertikale tilbageføring.

Aktiver denne funktion for opnåelse af bedst mulig billedkvalitet.

En deaktivering af denne funktion kan medføre billedforstyrrelser, fx forvrængninger (sildeben/sne).

Denne funktion kan deaktiveres til benchmarking.