Zeigt die vorhandenen Konfigurationsprofile an.

Das angewählte Profil wird aktiviert.


Neues Konfigurationsprofil hinzufügen.

Die Einstellungen des gerade angewählten Profils werden für das neue Profil dupliziert.


Löscht das angewählte Konfigurationsprofil von der Liste der Profile.


Ändern/Bearbeiten der Einstellungen für das angewählte Konfigurationsprofil.


Bitte wählen Sie:

4-Bit von jedem 32-Bit Framebuffer-Pixel als double-buffered Overlay Planes oder

8-Bit von jedem 32-Bit Framebuffer-Pixel als single-buffered Overlay Planes.


Setzt die Blit-Copy vom Hintergrund- in den Vordergrund-Buffer.


Buffer-Austausch synchronisiert in der vertikalen Abtastlücke des Monitors.

Aktivieren Sie diese Funktion, um die beste Bildqualität zu erzielen.

Wenn Sie diese Funktion deaktivieren, können Bildstörungen, z.B. Verzerrungen, auftreten.

Für Bildleistungs-Benchmarks kann die Funktion deaktiviert werden.