Shows a list of available configuration profiles.

Current selection will be active.


Add a new configuration profile to the list.

Settings of the current selection will be duplicated.


Delete current configuration from the profile list.


Modify the settings of the currently selected configuration profile.


Specify to use 4-bits double buffered or 8-bits single buffered of each 32-bit frame buffer pixel.


Force blit copy from back to front buffer


Have buffer swap ‘synched’ to vertical retrace.

Enable this function for best picture quality.

If you disable this functtion, you may experience visual artifacts such as tearing.

This function may be disabled for performance benchmarking.