這些按鈕可以為指定的解析度和更新頻率調整顯示器的顯示位置。


這些按鈕可以為指定的解析度和更新頻率調整顯示器的顯示大小。

注意：改變顯示大小會微量變更實際的更新頻率。如果您的顯示器使用固定頻率，請查閱顯示器的說明書，取得更新頻率容許度的相關資訊。


為指定的解析度和更新頻率變更顯示器同步訊號的兩極。

如果您對預設設定不滿意，可以嘗試變更這些設定。


按一下這個按鈕可以為指定的解析度和更新頻率復原上次所做的變更 ( 按下「套用」之後的變更 )。


按一下這個按鈕可以為指定的解析度和更新頻率將「顯示器頻率調整」設成出廠預設值。


選取這個核取方塊後，當您移動任何一個滑棒，三個滑棒會一起移動。


顯示亮度會與電源 Gamma 輸入電壓成比例，這種非線性必須被補償，以正確重製影像的亮度。顯示 Gamma 的效果是暗化相對於黑暗與明亮區域的中間地帶，Gamma 修正調整會影響整個螢幕的顯示。可用的設定範圍在 0.3 - 4.0 之間。

按一下「>1<」按鈕可以將設定設為預設的 1.0。

256 色模式無法使用 Gamma 修正調整。


您只能變更目前指定為您工作桌面的顯示器的設定。