Brug disse knapper til at justere placeringen af skærmbilledet for den angivne opløsning og opdateringshastighed.


Brug disse knapper til at justere størrelsen af skærmbilledet for den angivne opløsning og opdateringshastighed.

BEMÆRK! Når du ændrer skærmens størrelse, ændres den faktiske opdateringshastighed. Hvis du bruger en skærm med fast frekvens, kan du finde oplysninger om tolerancer i forbindelse med opdateringshastigheden i dokumentationen til skærmen.


Ændrer polariteten for skærmens synkroniseringssignaler for den angivne opløsning og opdateringshastighed.

Hvis skærmvisningen ikke er tilfredsstillende med standardindstillingerne, kan du prøve at ændre dem.


Klik på denne knap for at fortryde de seneste ændringer (da du f.eks. klikkede på "Anvend") for den angivne opløsning og opdateringshastighed.


Klik på denne knap for at nulstille skærmindstillingerne for den angivne opløsning og opdateringshastighed til standardindstillingerne.


Når dette afkrydsningsfelt er markeret, flyttes de tre skydere samtidigt, når du trækker i én af dem.


Skærmens lysstyrke er proportional med spændingen ophøjet til potensen af gammaværdien. Da denne værdi ikke udregnes lineært, skal der kompenseres for at opnå korrekt gengivelse af billedets lysstyrke. Virkningen af skærmgamma er at gøre mellemtonerne mørkere i forhold til de mørke og lyse områder. Gammajusteringen påvirker hele skærmvisningen. Intervallet for værdien er 0,3 – 4,0.

Klik på knappen “>1<” for at angive standardindstillingen 1,0.

Gammajusteringen kan ikke bruges i 256 farver-tilstand.


Du kan kun ændre disse indstillinger i forbindelse med skærme, der aktuelt er tildelt det aktive skrivebord.