Utilice estos botones para ajustar la posición de la pantalla del monitor para la resolución y el nivel de actualización indicados.


Utilice estos botones para ajustar el tamaño de la pantalla del monitor para la resolución y el nivel de actualización indicados.

NOTA: Al cambiar el tamaño de la pantalla, se modifica levemente el nivel de actualización real. Si utiliza un monitor de frecuencia fija, compruebe la documentación del monitor para obtener información sobre las tolerancias del nivel de actualización.


Cambia la polaridad de las señales de sincronización del monitor para la resolución y el nivel de actualización indicados.

Si no obtiene una presentación satisfactoria con la configuración predeterminada, puede intentar cambiarla.


Haga clic en este botón para deshacer los últimos cambios realizados (por ejemplo, cuando hizo clic en ‘Aplicar’) para la resolución y el nivel de actualización indicados.


Haga clic en este botón para fijar la ‘Sintonización del monitor’ para la resolución y el nivel de actualización indicados como la configuración predeterminada del fabricante.


Con esta casilla de verificación activada, los tres deslizadores se mueven a la vez al arrastrar cualquier deslizador individual.


El brillo que se produce en la superficie de la pantalla es proporcional al voltaje de entrada elevado a la potencia de gamma. Esta falta de linealidad se debe compensar para conseguir una reproducción correcta del brillo de la imagen. El efecto de la visualización de gamma consiste en oscurecer los tonos medios con relación a las zonas oscuras y claras. El ajuste de corrección de gamma afecta a toda la presentación de pantalla. El rango de configuración posible es de 0,3 a 4,0.

Haga clic en el botón “>1<” para fijar la configuración predeterminada de 1,0.

El ajuste de corrección de gamma no se puede utilizar en modo de 256 colores.


Sólo puede cambiar esta configuración para los monitores asignados actualmente al escritorio de trabajo.