Näiden painikkeiden avulla säädetään näytön sijaintia kuvaruudulla valittua erottelukykyä ja virkistystaajuutta käytettäessä.


Näiden painikkeiden avulla säädetään näytön kokoa valittua erottelukykyä ja virkistystaajuutta käytettäessä.

Huomautus: Näytön koon muuttaminen vaikuttaa hieman virkistystaajuuteen. Jos käytössä oleva näyttölaite toimii kiinteällä virkistystaajuudella, tarkista näyttölaitteen käyttöohjeista, mitä virkistystaajuuksia voidaan käyttää.


Muuttaa näyttölaitteen tahdistussignaalien polaarisuuden valitulla erottelukyvyllä ja virkistystaajuudella.

Jos näyttö ei toimi oikein oletusasetuksilla, voit kokeilla näiden asetusten muuttamista.


Tällä painikkeella kumotaan viimeksi tehdyt (Käytä-painiketta painamalla käyttöönotetut) muutokset valittua erottelukykyä ja virkistystaajuutta käytettäessä.


Tällä painikkeella näytön säädöiksi asetetaan valmistajan oletusasetukset valittua erottelukykyä ja virkistystaajuutta käytettäessä.


Kun tämä valintaruutu on valittuna, kaikki kolme säädintä liikkuvat yhtä aikaa, kun jotakin säätimistä liikutetaan.


Näyttöön tuotettava kirkkaus on suhteessa syöttöjännitteeseen korotettuna potenssiin gamma. Tämä epälineaarisuus täytyy kompensoida, jotta saavutetaan oikea kuvan kirkkaus. Gammakorjauksessa keskisävyjä tummennetaan suhteessa tummiin ja kirkkaisiin sävyihin. Gammakorjauksen säädöt vaikuttavat koko näyttöön. Asetuksen arvo voi olla väliltä 0,3 - 4,0.

Napsauttamalla “>1<“-painiketta palautetaan oletusasetus 1,0.

Gammakorjaussäätöjä ei voida käyttää 256 värin näyttötilassa.


Voit muuttaa näitä asetuksia vain työtilaan määritetyille näyttölaitteille.