Utilizzare questi pulsanti per regolare la posizione dello schermo in base alla risoluzione e alla frequenza di aggiornamento indicate.


Utilizzare questi pulsanti per regolare le dimensioni dello schermo in base alla risoluzione e alla frequenza di aggiornamento indicate.

NOTA: il ridimensionamento dello schermo influisce sulla frequenza di aggiornamento corrente. Se si utilizza un monitor a frequenza fissa, consultare la documentazione fornita con il monitor per informazioni sui margini di tolleranza della frequenza di aggiornamento.


Modifica la polarità dei segnali di sincronizzazione del monitor in base alla risoluzione e alla frequenza di aggiornamento indicate.

Se non si ottiene una visualizzazione efficace con le impostazioni predefinite, provare a cambiare le impostazioni.


Scegliere questo pulsante per annullare le ultime modifiche effettuate, vale a dire dopo aver scelto il pulsante Applica, in base alla risoluzione e alla frequenza di aggiornamento indicate.


Scegliere questo pulsante per ripristinare i valori di regolazione del monitor predefiniti in base alla risoluzione e alla frequenza di aggiornamento indicate.


Se la casella di controllo è selezionata, trascinando un dispositivo di scorrimento verranno spostati anche gli altri.


La luminosità prodotta dal monitor è proporzionale alla tensione in ingresso elevata alla potenza gamma. Per ottenere una corretta riproduzione della luminosità dell'immagine, sarà quindi necessario compensare tale mancanza di linearità. La gamma del monitor rende più scuri i mezzitoni delle aree ad alto contrasto. La regolazione della correzione gamma viene applicata all'intero schermo. L'intervallo delle impostazioni possibile è compreso tra 0,3 e 4,0.

Scegliere il pulsante “>1<” per impostare il valore predefinito di 1,0.

Non è possibile utilizzare la regolazione della correzione gamma con la modalità a 256 colori.


È possibile modificare queste impostazioni solo per i monitor correntemente assegnati al desktop di lavoro.