지정된 해상도와 재생률에 맞게 모니터 디스플레이의 위치를 조정하려면 이 단추들을 사용하십시오.


지정된 해상도와 재생률에 맞게 모니터 디스플레이의 크기를 조정하려면 이 단추들을 사용하십시오.

참고: 디스플레이의 크기를 약간만 조정해도 실제 재생률이 바뀝니다. 고정 주파수 모니터를 조정할 경우 모니터 설명서에서 재생률 허용 오차에 대해 확인하십시오.


지정된 해상도와 재생률에 맞게 모니터 동기 신호의 극성을 변경하십시오.

기본값으로 만족할 만한 화면을 얻지 못하면 설정을 변경해도 됩니다.


지정된 해상도와 재생률에 맞게 수정한 사항을 취소하려면(즉, '적용'을 누를 경우) 이 단추를 누르십시오.


지정된 해상도와 재생률에 대한 '모니터 조정'을 제조업체의 기본값으로 설정하려면 이 단추를 누르십시오.


선택난을 선택하면 각각의 이동막대를 끌때 세 개의 이동막대가 함께 움직입니다.


화면의 밝기는 전원 감마에 따라 높아지는 입력 전압에 비례합니다. 이러한 비선형이 보정되어야 이미지의 밝기를 올바르게 재생할 수 있습니다. 디스플레이 감마의 효과는 어둡고 밝은 영역에 상대적으로 중간 명암을 어둡게 하는 것입니다. 감마 수정 조정은 전체 화면 표시에 영향을 줍니다. 설정 가능한 범위는 0.3 - 4.0입니다.

기본값 1.0으로 설정하려면 '>1<' 단추를 누르십시오.

256색 모드에서는 감마 수정 조정을 사용할 수 없습니다.


현재 작업중인 데스크탑에 지정된 모니터의 설정만 변경할 수 있습니다.