U kunt deze knoppen gebruiken om de positie van het scherm van de monitor af te stemmen voor de aangegeven resolutie en vernieuwingsfrequentie.


U kunt deze knoppen gebruiken om de positie van het scherm van de monitor af te stemmen voor de aangegeven resolutie en vernieuwingsfrequentie.

OPMERKING: Als u de schermgrootte aanpast, wordt de feitelijke vernieuwingsfrequentie iets gewijzigd. Raadpleeg de documentatie bij uw monitor voor informatie over geaccepteerde vernieuwingsfrequenties als u een monitor met een vaste frequentie gebruikt.


Hiermee wijzigt u de polariteit van de synchronisatiesignalen van de monitor voor de aangegeven resolutie en vernieuwingsfrequentie.

Als u met de standaardinstellingen niet de gewenste weergave krijgt, kunt u proberen deze instellingen te wijzigen.


U kunt deze knop gebruiken als u de laatste wijziging (dat wil zeggen als u op ‘Toepassen’ hebt geklikt) voor de aangegeven resolutie en vernieuwingsfrequentie ongedaan wilt maken.


U kunt op deze knop klikken als u de instellingen onder ‘Monitor afstemmen’ voor de aangegeven resolutie en vernieuwingsfrequentie wilt instellen op de standaardinstellingen van de fabrikant.


Als u dit selectievakje selecteert, kunt u de drie schuifregelaars gelijktijdig verplaatsen.


De helderheid die wordt geproduceerd aan de voorzijde van het scherm is evenredig met het invoervoltage vermeerderd met het voedingsgamma. Deze niet-liniariteit moet worden gecompenseerd om een correcte weergave van de helderheid van het beeld te kunnen verkrijgen. Het effect van weergavegamma resulteert in donkerdere middentinten ten opzichte van de donkere en lichte gebieden. De aanpassing van de gammacorrectie is van invloed op de gehele schermweergave. Het bereik van mogelijke instellingen ligt tussen 0,3 - 4,0.

Klik op de knop “>1<” om de standaardinstelling 1,0 in te stellen.

De gammacorrectie kan niet worden aangepast in de modus 256 kleuren.


U kunt deze instellingen alleen wijzigen voor monitors die op dit moment aan uw huidige bureaublad zijn toegewezen.