Använd de här knapparna när du vill ställa in visningsytans position för angiven upplösning och uppdateringsfrekvens.


Använd de här knapparna när du vill ställa in visningsytans storlek för angiven upplösning och uppdateringsfrekvens.

Obs! Om du ändrar visningsytan ändras den faktiska uppdateringsfrekvensen något. Om du använder en bildskärm med fast frekvens bör du kontrollera informationen om tolerans för uppdateringsfrekvenser i dokumentationen till bildskärmen.


Ändrar polariteten för bildskärmens synksignaler för den angivna upplösningen och uppdateringsfrekvensen.

Om du inte får den visningsyta som du vill ha med standardinställningarna kan du försöka med att ändra de här inställningarna.


Klicka på den här knappen om du vill ångra de senaste ändringarna du utförde (dvs. när du klickade på ”Använd”) för den angivna upplösningen och uppdateringsfrekvensen.


Klicka på den här knappen om du vill återställa "bildskärmsinställningarna" för den angivna upplösningen och uppdateringsfrekvensen till tillverkarens standardinställningar.


Med den här kryssrutan markerad rör sig de tre reglagen tillsammans när du drar en av dem.


Den ljusstyrka som genereras på bildskärmens framsida står i proportion till den ingående spänningen upphöjd i gamma. Den här icke-linjäriteten måste kompenseras för att uppnå korrekt återgivning av bildens ljusstyrka. Bildskärmsgamma gör mellantonerna mörkare relativt de mörka och ljusa områdena. Gammakorrigeringen påverkar hela bildskärmsytan. Det möjliga inställningsintervallet är 0,3 - 4,0.

Klicka på knappen >1< om du vill ange standardinställningen 1,0.

Gammakorrigeringen kan inte användas i 256-färgsläge.


Du kan bara ändra de här inställningarna för de bildskärmar som för närvarande är tilldelade till det aktuella skrivbordet.