显示可用的组态设定档清单。

目前的选取会生效。


新增组态设定档至清单。

会复制前选取的设定。


从设定档清单中删除目前的组态。


修改目前选取的组态设定档。


指定使用每一个 32 位元页框缓�ㄇ�图素的 8 位元双重缓�ㄇ�或是 8 位元单一缓�ㄇ�。


强制从�刍撼迩�复制到前缓冲区。


使缓冲区置换同步讯号以垂直折返。

允许此功能，便可达到最佳影像质量。

若禁止此功能，可能将出现图象撕裂等现象。

需要进行性能基准测试时，便可暂时禁止此功能。