Muestra una lista de los perfiles de configuración disponibles.

La selección actual está activada.


Añada un nuevo perfil de configuración a la lista.

La configuración de la selección actual se duplica.


Elimine la configuración actual de la lista de perfiles.


Modifique la configuración del perfil de configuración seleccionado.


Especifique que se utilice búfer doble de 8 bits o búfer sencillo de 8 bits de cada píxel de búfer de marco de 32 bits.


Fuerce la copia rápida del búfer posterior al anterior.


Intercambio de búfer sincronizado para la reconstrucción vertical.

Active esta función para lograr la mejor calidad de imagen.

Si desactiva esta función podrían producirse fallos en la imagen como, por

ej., distorsiones.

Esta función se puede desactivar para los criterios de rendimiento.