Affiche une liste des profils de configuration disponibles.

La sélection courante sera active.


Ajoute un nouveau profil de configuration à la liste.

Les paramètres de la sélection courante seront dupliqués.


Supprime la configuration courante de la liste des profils.


Modifie les paramètres du profil de configuration couramment sélectionné.


Spécifie l’utilisation d’une mise en mémoire tampon double 8 bits ou simple 8 bits de chaque pixel de tampon de trame 32 bits.


Force le transfert de copie du tampon arrière vers le tampon avant


Synchronisation de la permutation de tampon et du retour vertical.

Activez cette fonction pour une qualité d’image optimale.

Si vous désactivez cette fonction, l’affichage risque d’être perturbé,

notamment par des distorsions.

Vous pouvez désactiver cette fonction pour réaliser les bancs d’essai des performances d’affichage.