Visualizza l’elenco dei profili di configurazione disponibili.

La selezione corrente sarà attiva.


Aggiunge un nuovo profilo di configurazione all’elenco.

Le impostazioni della selezione corrente verranno duplicate.


Elimina la configurazione corrente dall’elenco dei profili di configurazione.


Modifica le impostazioni del profilo di configurazione selezionato.


 Specifica l’utilizzo di 8 bit a doppio buffer o di 8 bit a buffer singolo per ogni pixel di frame a 32 bit bufferizzato.


Forza la copia dal buffer secondario a quello primario.


Sincronizza lo scambio di buffer sul ritracciamento verticale.
Abilitare questa funzione per migliorare la qualità dell'immagine.
Disattivando questa funzione è possibile che l'immagine risulti
deformata o distorta.
È possibile disattivare questa funzione per migliorare le prestazioni all'interno di un benchmark.