利用可能な構成プロファイルの一覧を表示します。

現在選択されている設定はアクティブ表示されます。


一覧に、新規の構成プロファイルを追加します。

現在の設定が複製されます。


現在選択されている構成プロファイルを一覧から削除します。


現在選択されている構成プロファイルの設定を修正します。


32ビットのフレーム・バッファを8ビット ダブル・バッファまたは8ビット シングル・バッファのどちらを使用するかを指定します。


このオプションを選択すると常にバック・バッファからフロント・バッファへのブリット・コピーを行います。


このオプションを選択するとバッファ・スワップを、垂直リトレースに同期して行います。

画像について最高の品質を得るには、この機能を有効にしてください。この機能を無効にすると、画像に歪みなどの障害が出る場合もあります。ただし、ベンチマーク・テストを行う際には、この機能を無効にしても構いません。