Geeft een lijst met beschikbare configuratieprofielen weer.

De huidige selectie is actief.


Voeg een nieuw configuratieprofiel toe aan de lijst.

De instellingen van de huidige selectie worden gedupliceerd.


Verwijder de huidige configuratie uit de profiellijst.


Wijzig de instellingen van het huidig geselecteerde configuratieprofiel.


Geef op of 8-bits, dubbele buffer of 8-bits, enkele buffer moet worden gebruikt voor elke 32-bits framebufferpixel.


Bitkopie van achterste buffer naar voorste buffer afdwingen.


Buffer-uitwisseling synchroniseert in verticale terugloop van de monitor.

Activeer deze functie om de beste beeldkwaliteit te bereiken.

Wanneer u deze functie deactiveert, kunnen er beeldstoringen, b.v. vervormingen, optreden.

Voor beeldprestatie-benchmarking kan deze functie worden gedeactiveerd.