Para usar esta función debe conectar unas gafas estéreo a la conexión estéreo de la tarjeta.

En la página web de Fire GL encontrará información sobre los tipos de gafas soportados.

Aviso: Esta opción no se puede usar en combinación con "Fullscene Antialiasing" o "D4D".

Seleccionando "Quad Buffer Stereo" se desactivan estas opciones automáticamente.


Para usar esta función debe conectar unas gafas estéreo a la conexión estéreo de la tarjeta.

En la página web de Fire GL encontrará información sobre los tipos de gafas soportados.

Aviso: Esta opción no se puede usar en combinación con "D4D".

Seleccionando "Quad Buffer Stereo" se desactiva "D4D" automáticamente.


Para usar esta función debe conectar unas gafas estéreo a la conexión estéreo de la tarjeta.

En la página web de Fire GL encontrará información sobre los tipos de gafas soportados.

Aviso: Esta opción no se puede usar en combinación con "Fullscene Antialiasing".

Seleccionando "Quad Buffer Stereo" se desactiva "Fullscene Antialiasing" automáticamente.


Para usar esta función debe conectar unas gafas estéreo a la conexión estéreo de la tarjeta.

En la página web de Fire GL encontrará información sobre los tipos de gafas soportados.


Mejor calidad de imagen, si su aplicación soporta esta función.

Aviso: Esta opción no se puede usar en combinación con "Quad Buffer Stereo".

Seleccionando " Fullscene Antialiasing " se desactiva "Quad Buffer Stereo" automáticamente.


Mejor calidad de imagen, si su aplicación soporta esta función.


Con el regulador puede optimizar la calidad de "Oversampling".

Si se aumenta la calidad Oversampling puede reducir la performance.


Seleccione esta opción si quiere utilizar "Fullscene Antialiasing" con aplicaciones OGL que no soportan esta función.

Esto puede reducir su performance.


Soporte de pantallas planas 3D autoesetereocópicas.

Para usar esta opción necesita un monitor del tipo "Dresden 3D Display".

Aviso: Esta opción no se puede usar en combinación con "Quad Buffer Stereo".

Seleccionando "D4D" se desactiva "Quad Buffer Stereo" automáticamente.


Soporte de pantallas planas 3D autoesetereocópicas.

Para usar esta opción necesita un monitor del tipo "Dresden 3D Display".


Seleccione esta opción si quiere renderizar de modo "off-screen" al p-buffer en lugar de en pantalla.


Esta extensión (WGL_OML_sync_control) proporciona el control necesario para aasegurar la sincronización entre los acontecimientos en la tarjeta gráfica (como p. ej. esperar a barrido vertical) y otros componentes del sistema. Las aplicaciones que requieren renderización en tiempo real son soportadas mediante sincronización de los gráficos con el vídeo o audio streaming.