このオプションを利用するには、ステレオ コネクタに接続したステレオ グラスが必要です。

サポートされているステレオ グラスの機種については、 Fire GL ウェブサイトでご確認ください.

注意：このオプションは、「 Fullscene Antialiasing 」や「 D4D 」と同時には利用できません。

「 Quad Buffer Stereo 」を有効にすると、「 Fullscene Antialiasing 」や「 D4D 」は自動的に無効にされます.


このオプションを利用するには、ステレオ コネクタに接続したステレオ グラスが必要です。

サポートされているステレオ グラスの機種については、 Fire GL ウェブサイトでご確認ください.

注意：このオプションは、「 D4D 」と同時には利用できません。

「 Quad Buffer Stereo 」を有効にすると、「 D4D 」は自動的に無効にされます.


このオプションを利用するには、ステレオ コネクタに接続したステレオ グラスが必要です。

サポートされているステレオ グラスの機種については、 Fire GL ウェブサイトでご確認ください.

注意：このオプションは、「 Fullscene Antialiasing 」と同時には利用できません。

「 Quad Buffer Stereo 」を有効にすると、「 Fullscene Antialiasing 」は自動的に無効にされます.


このオプションを利用するには、ステレオ コネクタに接続したステレオ グラスが必要です。

サポートされているステレオ グラスの機種については、 Fire GL ウェブサイトでご確認ください.


高画質（使用するアプリケーションがこの機能をサポートしている場合）.

注意：このオプションは、「 Quad Buffer Stereo 」と同時には利用できません。

「 Fullscene Antialiasing 」を有効にすると、「 Quad Buffer Stereo 」は自動的に無効にされます.


高画質（使用するアプリケーションがこの機能をサポートしている場合）.


「オーバーサンプリングの質」を最適化するには、スライダーを動かしてください。

オーバーサンプリングの質を高くすると、パフォーマンスが低下する場合があります.


このオプションをチェックすると、「 Fullscene Antialiasing 」をサポートしていない OGL アプリケーションについても、その機能を利用できます。

ただし、その場合、パフォーマンスが低下する場合があります.


オートステレオスコープ 3D フラット ディスプレイのサポート

このオプションを利用するには、モニタの機種として「 Dresden 3D ディスプレイ」が必要です.

注意：このオプションは、「 Quad Buffer Stereo 」と同時には利用できません。

「 D4D 」を有効にすると、「 Quad Buffer Stereo 」は自動的に無効にされます.


オートステレオスコープ 3D フラット ディスプレイのサポート

このオプションを利用するには、モニタの機種として「 Dresden 3D ディスプレイ」が必要です.


このオプションをチェックすると、オン スクリーンでではなく、オフ スクリーンのＰバッファでレンダリングを行ないます.


この機能拡張（ WGL_OML_sync_control ）は、垂直リトレースなどグラフィックス

カードと、システムの他のパーツとの間で、イベントの同期を確立するのに必要な

制御を可能にします。グラフィックスと、ストリーミング ビデオやストリーミング

オーディオとの同期を精確に取ることにより、リアルタイム レンダリングを必要とする

アプリケーションをサポートします.