Voor deze optie moet er een stereobril aangesloten zijn op de stereo-uitgang van de kaart.

Op de website van Fire GL is de informatie te vinden, welke stereobrillen worden ondersteund.

Opmerking: deze optie kan niet samen met "Fullscene Antialiasing" of "D4D" worden gekozen.

Wanneer "Quad Buffer Stereo" wordt gekozen, wordt deze optie automatisch gedeactiveerd.


Voor deze optie moet er een stereobril aangesloten zijn op de stereo-uitgang van de kaart.

Op de website van Fire GL is de informatie te vinden, welke stereobrillen worden ondersteund.

Opmerking: deze optie kan niet samen met "D4D" worden gekozen.

Wanneer "Quad Buffer Stereo" wordt gekozen, wordt "D4D" automatisch gedeactiveerd.


Voor deze optie moet er een stereobril aangesloten zijn op de stereo-uitgang van de kaart.

Op de website van Fire GL is de informatie te vinden, welke stereobrillen worden ondersteund.

Opmerking: deze optie kan niet samen met "Fullscene Antialiasing" worden gekozen.

Wanneer "Quad Buffer Stereo" wordt gekozen, wordt "Fullscene Antialiasing" automatisch gedeactiveerd.


Voor deze optie moet er een stereobril aangesloten zijn op de stereo-uitgang van de kaart.

Op de website van Fire GL is de informatie te vinden, welke stereobrillen worden ondersteund.


Verbeterde beeldkwaliteit, indien uw toepassing deze functie ondersteunt.

Opmerking: deze optie kan niet samen met "Quad Buffer Stereo" worden gekozen.

Wanneer "Fullscene Antialiasing" wordt gekozen, wordt "Quad Buffer Stereo" automatisch gedeactiveerd.


Verbeterde beeldkwaliteit, indien uw toepassing deze functie ondersteunt.


Met behulp van de schuifregelaar kan de "Oversampling-kwaliteit" worden geoptimaliseerd.

Een betere Oversampling-kwaliteit kan de prestatie verminderen.


Kies deze optie indien u "Fullscene Antialiasing" ook voor OGL-toepassingen wilt gebruiken, die deze functie niet ondersteunen.

Dit kan de prestatie verminderen.


Ondersteuning van autostereoscopische 3D platte beeldschermen.

Voor deze optie is een monitor van het type "Dresden 3D Display" vereist.

Opmerking: deze optie kan niet samen met "Quad Buffer Stereo" worden gekozen.

Wanneer "D4D" wordt gekozen, wordt "Quad Buffer Stereo" automatisch gedeactiveerd.


Ondersteuning van autostereoscopische 3D platte beeldschermen.

Voor deze optie is een monitor van het type "Dresden 3D Display" vereist.


Kies deze optie wanneer u, in plaats van aan het beeldscherm "off-screen" in de P-buffer wilt renderen.


Deze extensie (WGL_OML_sync_control) levert de noodzakelijke besturing, om de synchronisatie tussen gebeurtenissen op de grafisch kaart (zoals vertical retrace) en andere systeemcomponenten veilig te stellen. Applicaties, die real-time rendering nodig hebben, worden door middel van nauwkeurige synchronisatie tussen grafische gegevens en streaming video resp. - audio onderteund.