显示根据制造商名称排序的可用监视器列表。

要从中选择一个监视器，滚动屏幕找到监视器的制造商，或键入制造商名称的第一个字母 在 �+� 符号上单击并选择监视器。

如果您使用的监视器不在列表中，而您手中有一张制造商提供的软盘，那么可以使用“获取磁盘”按钮。

只有在选中了“从列表中选择”的选项时，您才能从列表中选择监视器！

在单击“应用”或“确定”按钮后，对监视器的选择才有效。

如果所选监视器不支持当前的视频模式，分辨率/刷新频率将被降低。


显示当前指派给系统的监视器。

如果选择了一个新的监视器，此更改只有在按下了“应用”或“确定”按钮时才生效。


选择该选项能让您选择视频芯片所支持的最高分辨率/刷新频率。

使用“显示属性”中的“设置”选项卡来选择自定义模式。

警告：如果监视器不支持所选的分辨率或刷新频率，它会永久损坏您的监视器。


选择该选项能让您选择视频芯片所支持的最高分辨率/刷新频率。

警告：如果监视器不支持所选的分辨率或刷新频率，它会永久损坏您的监视器。


选择该选项能让您手动从以下列表中选择监视器。


选择该选项将禁用监视器列表。

在单击了“应用”或“确定”按钮后，系统将在每次重新启动时尝试检测 DDC 监视器。

要马上检测一个新的 DDC 监视器，请单击“开始检测”按钮。


仅当选择了“从列表中选择”选项时，该按钮才可用。

如果您手中有监视器制造商提供的软盘，您可以将它导入监视器总表中。

为此，请单击此按钮并选择含有监视器信息的目录或文件。 然后选择监视器并单击“应用”或“确定”按钮。


仅当选择了“即插即用监视器”选项时，该按钮才可用。

如果单击此按钮，系统将立即尝试检测 DDC 监视器。 如果没有连接 DDC 监视器，将出现一个错误信息。


显示分辨率列表，后附当前所选监视器所支持分辨率的最高刷新频率。


当监视器列表显示出制造商所提供软盘的内容时，会出现此按钮。

单击此按钮以再次显示内部监视器列表。


在显示器表面所产生的亮度是和输入电压所产生的电磁成正比的。 必须补偿此非线性以达到对图像亮度的正确重现。 显示反差就是暗化明暗区域之间的中间色调。 对灰度校正的调整会影响整个屏幕显示。 可能的设置范围是 0.3 - 4.0。

单击“>1<”按钮设置默认的 1.0 值。

不能在 256 色模式下使用灰度校正调整。


更改显示适配器的刷新频率。 刷新频率越高，在屏幕上看到的闪动就越少。