Viser en liste over skærme sorteret efter producent.

Hvis du vil vælge en skærm, skal du rulle ned til producenten af din skærmtype eller skrive de første bogstaver i navnet på producenten, indtil producenten fremhæves på listen. Klik på +-tegnet, og vælg skærm.

Hvis din skærm ikke står på listen, og du har en diskette fra producenten, kan du klikke på knappen Har diskette.

Du kan kun vælge en skærm på listen, hvis punktet "Vælg fra liste" er markeret!

Valget af en skærm træder i kraft, når du klikker på knappen "Anvend" eller "OK".

Hvis den valgte skærm ikke understøtter den aktuelle skærmopløsning, reduceres opløsningen eller opdateringshastigheden.


Viser den skærm, der aktuelt er tildelt systemet.

Hvis du vælger en ny skærm, træder ændringen først i kraft, når du klikker på knappen "Anvend" eller "OK".


Når du vælger denne mulighed, kan du udnytte grafikchippens fulde opløsning og opdateringshastighed.

Brug fanen Indstillinger i dialogboksen Egenskaber for skærm til at vælge brugerdefinerede tilstande.

Advarsel: Hvis du vælger en opløsning eller opdateringshastighed, som skærmen ikke understøtter, kan det beskadige skærmen permanent.


Når du vælger denne mulighed, kan du udnytte grafikchippens fulde opløsning og opdateringshastighed.

Advarsel: Hvis du vælger en opløsning eller opdateringshastighed, som skærmen ikke understøtter, kan det beskadige skærmen permanent.


Hvis du vælger denne mulighed, kan du manuelt vælge en skærm på nedenstående liste.


Når du vælger denne mulighed, deaktiveres skærmlisten.

Når du har klikket på knappen "Anvend" eller "OK", forsøger systemet at finde en DDC-skærm, hver gang computeren genstartes.

Hvis du vil finde en ny DDC-skærm med det samme, skal du klikke på knappen "Find nu".


Du kan kun klikke på knappen, hvis du klikker på "Vælg fra liste".

Hvis du har en diskette fra producenten af skærmen, kan du importere den til den globale skærmliste.

Klik på denne knap, og vælg et bibliotek eller en fil, der indeholder oplysninger om skærmen.


Vælg din skærm, og klik på knappen "Anvend" eller "OK".


Du kan kun klikke på knappen, hvis du har valgt ‘PnP-skærm’.

Hvis du klikker på denne knap, forsøger systemet øjeblikkeligt at finde en DDC-skærm. Hvis der ikke er tilsluttet en DDC-skærm, vises der en fejlmeddelelse.


Viser en liste over opløsninger efterfulgt af den maksimale opdateringshastighed for hver opløsning, der understøttes af den aktuelt valgte skærm.


Denne knap vises, når skærmlisten viser indholdet af en diskette fra en producent.

Klik på denne knap for at få vist den interne skærmliste igen.


Skærmens lysstyrke er proportional med spændingen ophøjet til potensen af gammaværdien. Da denne værdi ikke udregnes lineært, skal der kompenseres for at opnå korrekt gengivelse af billedets lysstyrke. Virkningen af skærmgamma er at gøre mellemtonerne mørkere i forhold til de mørke og lyse områder. Gammajusteringen påvirker hele skærmvisningen. Intervallet for værdien er 0,3 – 4,0.

Klik på knappen ">1<" for at angive standardindstillingen 1,0.

Gamma-justeringen kan ikke bruges i 256 farver-tilstand.


Ændrer skærmkortets opdateringshastighed. Jo højere opdateringshastigheden er, desto mindre flimrer skærmen.