Zeigt, nach Herstellern sortiert, eine Liste der verfügbaren Monitore.

Zum Auswählen eines Monitors blättern Sie zumHersteller Ihres Monitors, oder geben Sie den ersten Buchstaben des Herstellernamens ein, bis der Hersteller in der Liste hervorgehoben erscheint. Klicken Sie auf das '+' Zeichen und wählen Sie Ihren Monitor.

Wenn Ihr Monitor nicht in der Liste aufgeführt ist und Sie eine Disk des Herstellers haben, können Sie die Schaltfläche 'Diskette' verwenden.

Die Option 'von Liste auswählen' muß angewählt sein, damit Sie einen Monitor von der Liste auswählen können!

Die Auswahl des Monitors wird erst aktiv, wenn Sie auf 'Übernehmen' oder 'OK' klicken.

Wird der aktuell angewählte Videomodus vom ausgewählten Monitor nicht unterstützt, werden Auflösung/Bildwiederholrate verringert.


Zeigt den aktuell dem System zugewiesenen Monitor an.

Wenn Sie einen anderen Monitor wählen, wird die Änderung erst aktiv, wenn Sie auf 'Übernehmen' oder 'OK' klicken.


Mit dieser Option können Sie die volle Leistung des Videochips bezüglich Auflösung/Bildwiederholrate -nutzen.

Stellen Sie den gewünschten Videomodus mit 'Einstellungen' im Menü 'Eigenschaften von Anzeige' ein.

Warnung! - Wenn Sie eine Auflösung oder Bildwiederholrate wählen, die von Ihrem Monitor nicht unterstützt wird, kann dies Dauerschäden an Ihrem Monitor verursachen.


Mit dieser Option können Sie die volle Leistung des Videochips bezüglich Auflösung/Bildwiederholrate -nutzen.

Warnung! - Wenn Sie eine Auflösung oder Bildwiederholrate wählen, die von Ihrem Monitor nicht unterstützt wird, kann dies Dauerschäden an Ihrem Monitor verursachen.


Mit dieser Option können Sie einen Monitor aus der untenstehenden Liste auswählen.


Mit dieser Option wird die Monitorliste inaktiv.

Nach Klicken auf ‘Übernehmen’ oder ‘OK’ versucht das System bei jedem Neustart einen DDC-Monitor zu finden.

Klicken Sie auf die Schaltfläche 'Finde jetzt' , um einen neuen DDC-Monitor sofort zu finden.


Diese Schaltfläche ist nur aktiv, wenn die Option 'von Liste auswählen' angewählt ist.

Wenn Sie eine Disk des Monitorherstellers haben, können Sie diesen Monitor mit in die allgemeine Monitorliste aufnehmen.

Dazu klicken Sie auf diese Schaltfläche und wählen Sie auf der Diskette das Verzeichnis oder die Datei mit den Informationen zu Ihrem Monitor an. Dann wählen Sie Ihren Monitor aus und klicken auf 'Übernehmen' oder 'OK'.


Diese Schaltfläche ist nur aktiv, wenn die Option ‘PnP Monitor’ angewählt ist.

Wenn Sie diese Schaltfläche klicken, versucht das System sofort einen DDC-Monitor zu finden. Wenn kein DDC-Monitor angeschlossen ist, erscheint eine Fehlermeldung.


Zeigt eine Liste mit Auflösungen - und für jede Auflösung die maximale Bildwiederholrate-, die vom aktuell angewählten Monitor unterstützt werden.


Diese Schaltfläche erscheint, wenn die Monitorliste den Inhalt einer Herstellerdisk anzeigt.

Klicken Sie diese Schaltfläche um wieder die interne Monitorliste anzuzeigen.


Die Bildschirmhelligkeit ist proportional zur Eingangsspannung hoch Gamma. Diese Nicht-Linearität  muß kompensiert werden um die Helligkeitswerte eines Bildes korrekt wiedergeben zu können. Der Bildschirm-Gammaeffekt bewirkt daß Mitteltöne im Vergleich zu dunklen oder hellen Bereichen zu dunkel dargetellt werden.

Die Gamma-Korrektur betrifft die gesamte Bildschirmdarstellung. Der Einstellbereich ist 0.3 - 4.0.

Klicken Sie auf “>1<” für die Standardeinstellung von 1.0.

Im 256-Farbenmodus ist keine Gamma-Korrektur möglich.


Ändert die Wiederholrate des Bildschirm-Grafikadapters. Je höher die Wiederholrate ist, umso weniger flickert Ihr Bildschirm.