Muestra una lista de los monitores disponibles clasificados por fabricante.

Para seleccionar un monitor, desplácese hacia el fabricante de su monitor o escriba el primer carácter del nombre del fabricante hasta que éste aparezca resaltado en la lista. Haga clic en el signo '+' y seleccione su monitor.

Si el monitor no aparece en la lista y tiene un disco del fabricante, puede usar el botón 'Utilizar disco'.

Sólo puede seleccionar un monitor de la lista si la opción 'Seleccionar de la lista' está activada.

La selección del monitor se efectuará cuando haga clic en el botón 'Aplicar' o 'Aceptar'.

Si el monitor seleccionado no admite el modo de vídeo actual, disminuye el nivel de resolución o actualización.


Muestra el monitor asignado actualmente al sistema.

Si selecciona un nuevo monitor, el cambio no se realizará hasta que no haga clic en el botón 'Aplicar' o 'Aceptar'.


Si selecciona esta opción, podrá elegir todas las capacidades de los niveles de resolución y actualización del chip del vídeo.

Utilice la ficha Mostrar propiedades, Configuración para seleccionar los modos personalizados.

Advertencia: si selecciona un nivel de resolución o actualización que el monitor no admite, se pueden producir daños irreparables en éste.


Si selecciona esta opción, podrá elegir todas las capacidades de los niveles de resolución y actualización del chip del vídeo.

Advertencia: si selecciona un nivel de resolución o actualización que el monitor no admite, se pueden producir daños irreparables en éste.


Si selecciona esta opción, podrá seleccionar manualmente un monitor en la lista siguiente.


Si selecciona esta opción, se desactivará la lista de monitores.

Al hacer clic en el botón 'Aplicar' o 'Aceptar', el sistema intentará detectar un monitor DDC cada vez que se reinicie.

Para detectar un nuevo monitor DDC de forma inmediata, haga clic en el botón 'Detectar ahora'.


Sólo se puede acceder a este botón si la opción 'Seleccionar de la lista' está activada.

Si tiene un disquete del fabricante del monitor, puede importarlo a la lista global de monitores.

Para ello, haga clic en este botón y seleccione un directorio o un archivo que contenga información sobre el monitor. A continuación, seleccione su monitor y haga clic en el botón 'Aplicar' o 'Aceptar'.


Sólo se puede acceder a este botón si la opción 'Monitor PnP' está seleccionada.

Si hace clic en este botón, el sistema intentará detectar un monitor DDC inmediatamente. Si el monitor DDC no está conectado, aparecerá un mensaje de error.


Muestra una lista de las resoluciones admitidas por el monitor seleccionado, seguida del máximo nivel de actualización para cada resolución.


Este botón aparece cuando la lista de monitores muestra el contenido de un disco del fabricante.

Haga clic en este botón para volver a ver las lista de monitores interna.


El brillo que se produce en la superficie de la pantalla es proporcional al voltaje de entrada elevado a la potencia de gamma. Esta falta de linealidad se debe compensar para conseguir una reproducción correcta del brillo de la imagen. El efecto de la visualización de gamma consiste en oscurecer los tonos medios con relación a las zonas oscuras y claras. El ajuste de corrección de gamma afecta a toda la presentación de pantalla. El rango de configuración posible es de 0,3 a 4,0.

Haga clic en el botón ">1<" para fijar la configuración por defecto de 1,0.

El ajuste de corrección de gamma no se puede utilizar en modo de 256 colores.


Cambia el nivel de actualización del adaptador de pantalla. Cuanto mayor sea el nivel de actualización, menos parpadeará la pantalla.