Affiche une liste des moniteurs disponibles triés par constructeur.

Pour sélectionner un moniteur, accédez par défilement au constructeur de votre moniteur ou tapez le premier caractère du nom du constructeur jusqu’à ce dernier apparaisse en surbrillance dans la liste. Cliquez sur le signe ‘+’ et sélectionnez votre moniteur.

Si votre moniteur ne figure pas dans la liste, et si votre disque provient du constructeur correspondant, vous pouvez cliquer sur le bouton ‘Disque fourni’.

Vous ne pouvez sélectionner un moniteur dans la liste que si l’option ‘Sélectionner dans la liste’ est sélectionnée !

La sélection d’un moniteur ne prend effet que lorsque vous cliquez sur le bouton ‘Appliquer’ ou ‘OK’.

Si le mode vidéo courant n’est pas pris en charge par le moniteur sélectionné, la résolution/le taux de rafraîchissement sera diminué.


Affiche le moniteur couramment affecté au système.

Si vous sélectionnez un nouveau moniteur, la modification ne prendra pas effet tant que vous n’avez pas cliqué sur le bouton ‘Appliquer’ ou ‘OK’.


La sélection de cette option vous permettra de choisir l’intégralité des fonctionnalités de résolution/taux de rafraîchissement de la puce vidéo.

Utilisez l’option Propriétés de l’affichage de l’onglet Paramètres pour sélectionner vos modes personnalisés.

Attention, la sélection d’une résolution ou d’un taux de rafraîchissement non pris en charge par votre moniteur risque d’endommager de façon permanente le moniteur.


La sélection de cette option vous permettra de choisir l’intégralité des fonctionnalités de résolution/taux de rafraîchissement de la puce vidéo.

Attention, la sélection d’une résolution ou d’un taux de rafraîchissement non pris en charge par votre moniteur risque d’endommager de façon permanente le moniteur.


La sélection de cette option va vous permettre de choisir un moniteur manuellement dans la liste ci-dessous.


La sélection de cette option va désactiver la liste des moniteurs.

Dès que vous avez cliqué sur le bouton ‘Appliquer’ ou ‘OK’, le système va essayer de détecter un moniteur DDC à chaque redémarrage.

Pour détecter un nouveau moniteur DDC immédiatement, cliquez sur le bouton ‘Détecter maintenant’.


Ce bouton n’est accessible que si l’option ‘Sélectionner dans la liste’ est sélectionnée.

Si vous disposez d’une disquette fournie par le constructeur de votre moniteur, vous pouvez l’importer dans la liste globale des moniteurs.

Pour ce faire, cliquez sur ce bouton et sélectionnez un répertoire ou un fichier contenant des informations sur votre moniteur. Ensuite, sélectionnez votre moniteur et cliquez sur le bouton ‘Appliquer’ ou ‘OK’.


Ce bouton n’est accessible que si l’option ‘Moniteur PnP’ est sélectionnée.

Si vous cliquez sur ce bouton, le système va immédiatement détecter un moniteur DDC. Si aucun moniteur DDC n’est connecté, un message d’erreur sera affiché.


Affiche une liste des résolutions, suivie du taux de rafraîchissement maximal de chaque résolution pris en charge par le moniteur couramment sélectionné.


Ce bouton s’affiche lorsque la liste des moniteurs affiche le contenu d’une disque du constructeur.

Cliquez sur ce bouton pour afficher à nouveau la liste des moniteurs internes.


La luminosité produite par l’écran est proportionnelle à la tension d’entrée élevée à la puissance gamma. Cette non-linéarité doit être compensée pour obtenir une reproduction correcte de la luminosité de l’image. Le gamma d’affichage a pour effet d’assombrir les tons médians par rapport aux zones foncées et lumineuses. L’ajustement de la correction gamma affecte l’intégralité de l’affichage. La plage de paramètres possibles va de 0,3 à 4,0.

Cliquez sur le bouton “>1<” pour définir le paramètre par défaut de 1,0.

L’ajustement de la correction gamma ne peut être utilisé dans le mode 256 couleurs.


Change le taux de rafraîchissement de l’adaptateur d’affichage. Plus celui-ci est élevé, moins l’écran scintillera.