Visualizza un elenco di monitor disponibili, ordinati per produttore.

Per selezionare un monitor, scorrere fino al produttore del monitor desiderato o digitare la prima lettera del nome del produttore in modo che il nome del produttore nell’elenco risulterà evidenziato. Fare clic sul segno + e selezionare il monitor desiderato.

Se il monitor desiderato non è presente nell’elenco e si dispone del disco fornito dal produttore, scegliere il pulsante Disco driver.

Sarà possibile selezionare il monitor dall’elenco solo se è stata selezionata l’opzione Seleziona dall’elenco.

Per rendere effettiva la selezione dell’elenco, scegliere il pulsante OK o Applica.

Se la modalità video corrente non è supportata dal monitor selezionato, la risoluzione e la frequenza di aggiornamento verranno ridotte.


Visualizza il monitor correntemente assegnato al sistema.

Se si seleziona un nuovo monitor, sarà necessario scegliere il pulsante OK o Applica per rendere effettiva la modifica.


Consente di scegliere la risoluzione e la frequenza di aggiornamento massime del chip video.

Per selezionare le modalità personalizzate, scegliere la scheda Impostazioni della finestra di dialogo Proprietà - Schermo.

Avviso: la selezione di una risoluzione o di una frequenza di aggiornamento non supportata dal monitor può causare danni permanenti al monitor.


Consente di scegliere la risoluzione e la frequenza di aggiornamento massime del chip video.

Avviso: la selezione di una risoluzione o di una frequenza di aggiornamento non supportata dal monitor può causare danni permanenti al monitor.


Consente di selezionare manualmente un monitor dall’elenco.


Disattiva l’elenco dei monitor.

Se si sceglie il pulsante Applica o OK, il sistema tenterà di rilevare un monitor DDC dopo ogni riavvio.

Per rilevare immediatamente un monitor DDC, scegliere il pulsante Rileva ora.


Il pulsante è disponibile, solo se è stata selezionata l’opzione Seleziona dall’elenco.

Se si dispone del disco fornito dal produttore, sarà possibile importare le informazioni contenute sul disco nell’elenco generale dei monitor.

Per eseguire questa operazione, scegliere questo pulsante e selezionare una directory o un file contenente le informazioni relative al monitor. Quindi selezionare il monitor desiderato e scegliere il pulsante Applica o OK.


Questo pulsante è disponibile solo se è stata selezionata l’opzione Monitor PnP.

Se si sceglie questo pulsante, il sistema tenterà di rilevare un monitor DDC. Se non viene rilevato alcun monitor DDC collegato, verrà visualizzato un messaggio di errore.


Visualizza l’elenco delle risoluzioni supportate dal monitor selezionato con accanto la frequenza di aggiornamento massima per ciascuna di esse.


Questo pulsante è disponibile quando nell’elenco dei monitor viene visualizzato il contenuto del disco del produttore.

Per visualizzare nuovamente l’elenco dei monitor interni, scegliere questo pulsante.


La luminosità prodotta dal monitor è proporzionale alla tensione in ingresso elevata alla potenza gamma. Per ottenere una corretta riproduzione della luminosità dell’immagine, sarà necessario quindi compensare questa mancanza di linearità. La gamma del monitor rende più scuri i mezzitoni delle aree ad alto contrasto. La regolazione della correzione gamma viene applicata all’intero schermo. L’intervallo di impostazione è compreso tra 0,3 e 4,0.

Per ottenere l’impostazione predefinita di 1,0, scegliere il pulsante >1<.

È possibile utilizzare la regolazione della correzione gamma con la modalità a 256 colori.


Modifica la frequenza di aggiornamento della scheda video. Più la frequenza di aggiornamento è elevata, minore risulterà lo sfarfallio dello schermo.