製造元の順序で並べ替えられている利用可能なモニタの一覧を表示します。

モニタを選択するには、製造元が強調表示されるまでスクロールするか、製造元の1文字目を入力してください。'+'をクリックして、モニタを選択してください。

モニタが一覧になく、製造元からのディスクがある場合は、[ディスク使用]ボタンを使用してください。

[一覧から選択]オプションが選択されている場合は、モニタを一覧から選択してください。

[適用]または[OK]ボタンをクリックすると、選択したモニタが有効になります。

選択したモニタが現在のビデオ・モードをサポートしていない場合は、サポートされている解像度/リフレッシュ・レートに変更されます。


システムに割り当てられているモニタを表示します。

新しいモニタを選択した場合は、[適用]または[OK]ボタンをクリックして変更を有効にします。


このオプションを選択することによって、ビデオ・チップの全解像度およびリフレッシュ・レートを選択することができます。

[画面のプロパティ]の[ディスプレイの設定]タブで、解像度およびリフレッシュ・レートを選択してください。

警告 : モニタがサポートしていない解像度またはリフレッシュ・レートを選択すると、モニタが破損する可能性があります。


このオプションを選択することによって、ビデオ・チップの全解像度およびリフレッシュ・レートを選択することができます。

警告 : モニタがサポートしていない解像度またはリフレッシュ・レートを選択すると、モニタが破損する可能性があります。


このオプションを選択すると、次の一覧からモニタを選択することができます。


このオプションを選択すると、モニタの一覧を無効にします。

[適用]または[OK]ボタンをクリックすると、再起動時にシステムがDDCモニターを検出します。

DDCモニタを検出するには、[検出開始]ボタンをクリックします。


このボタンは、[一覧から選択]オプションが選択された場合にのみ有効になります。

モニタの製造元からのディスクがある場合は、モニタの一覧にインポートすることができます。

このボタンをクリックして、モニタに関する情報が含まれているディレクトリまたはファイルを選択してください。モニターを選択して、[適用]または[OK]をクリックしてください。


このボタンは、[PnPモニタ]オプションが選択された場合にのみ有効になります。

このボタンをクリックすると、システムはDDCモニタを検出します。DDCモニタが接続されていない場合は、エラー・メッセージが表示されます。


選択したモニタがサポートしている解像度の一覧、および各解像度の最大リフレッシュ・レートが表示されます。


このボタンは、製造元からのディスクの内容を一覧表示している場合に表示されます。

このボタンをクリックすると、内部モニタの一覧が再表示されます。


ディスプレイの明るさは、入力電圧のガンマ乗に比例します。ガンマ曲線は、画像の明るさを正しく再生成するために使われます。ガンマ・ディスプレイの効果は、暗および明領域に関してのミッドトーンを暗くします。ガンマ・コレクションの調整は、画面表示に影響します。設定範囲は、0.3から0.4です。

[>1<]ボタンをクリックして、デフォルトの1.0に設定します。

ガンマ・コレクションの調整は、256カラー・モードでは使用できません。


ディスプレイ・アダプタのリフレッシュ・レートを変更します。リフレッシュ・レートが高いと、画面のちらつきが軽減されます。