사용 가능한 모니터 목록을 제조업체에서 분류한 대로 나타냅니다.

모니터를 선택하려면 모니터 제조업체로 화면 이동하거나 목록에서 제조업체가 강조 표시될 때까지 제조업체 이름의 첫 문자를 입력하십시오. '+' 기호를 누르고 모니터를 선택하십시오.

목록에 모니터가 없고 제조업체에서 구한 디스크가 있으면 '디스크 있음' 단추를 누르십시오.

'목록에서 선택' 선택사항을 선택하면 목록에서만 모니터를 선택할 수 있습니다!

'적용'이나 '확인' 단추를 누르면 선택한 모니터가 유효하게 됩니다.

현재 비디오 모드가 선택한 모니터에서 지원되지 않으면 해상도/재생률이 떨어집니다.


현재 시스템에 할당된 모니터를 나타냅니다.

새 모니터를 선택해도 '적용'이나 '확인' 단추를 눌러야 변경내용이 유효합니다.


이 선택사항을 선택하면 비디오 칩의 전체 해상도/재생률 기능을 선택할 수 있습니다.

디스플레이 등록정보, 설정 탭을 사용하여 사용자 정의 모드를 선택하십시오.

경고, 모니터에서 지원하지 않는 해상도나 재생률을 선택하면 모니터가 영구적으로 손상될 수 있습니다.


이 선택사항을 선택하면 비디오 칩의 전체 해상도/재생률 기능을 선택할 수 있습니다.

경고, 모니터에서 지원하지 않는 해상도나 재생률을 선택하면 모니터가 영구적으로 손상될 수 있습니다.


이 선택사항을 선택하면 아래 목록에서 수동으로 모니터를 선택할 수 있습니다.


이 선택사항을 선택하면 모니터 목록을 사용할 수 없습니다.

'적용'이나 '확인' 단추를 누르면 재부팅할 때마다 DDC 모니터를 감지하게 됩니다.

새 DDC 모니터를 즉시 감지하려면 '지금 감지' 단추를 누르십시오.


이 단추는 '목록에서 선택' 선택사항을 선택할 때만 사용할 수 있습니다.

모니터 제조업체에서 구한 디스켓이 있으면 전역 모니터 목록으로 가져올 수 있습니다.

이렇게 하려면 이 단추를 누르고 모니터에 관한 정보가 들어 있는 디렉토리나 파일을 선택하십시오. 그런 다음 모니터를 선택하고 '적용'이나 '확인' 단추를 누르십시오.


이 단추는 'PnP 모니터'를 선택해야만 사용할 수 있습니다.

이 단추를 누르면 즉시 DDC 모니터를 감지합니다. DDC 모니터가 연결되어 있지 않으면 오류 메시지가 표시됩니다.


현재 선택한 모니터에서 지원하는 해상도 목록이 나타나며 그 뒤에 각 해상도의 최대 재생률이 표시됩니다.


이 단추는 모니터 목록에 제조업체 디스크의 내용이 있을 때 표시됩니다.

내부 모니터 목록을 다시 보려면 이 단추를 누르십시오.


화면의 밝기는 전원 감마에 따라 높아지는 입력 전압에 비례합니다. 이러한 비선형이 보정되어야 이미지의 밝기를 올바르게 재생할 수 있습니다. 디스플레이 감마의 효과는 어둡고 밝은 영역에 상대적으로 중간 명암을 어둡게 하는 것입니다. 감마 수정 조정은 전체 화면 표시에 영향을 줍니다. 설정 가능한 범위는 0.3 - 4.0입니다.

기본값 1.0으로 설정하려면 '>1<' 단추를 누르십시오.

256색 모드에서는 감마 수정 조정을 사용할 수 없습니다.


디스플레이 어댑터 재생률을 변경합니다. 재생률이 높을수록 화면이 깜빡거리지 않습니다.