Geeft een lijst weer met beschikbare monitoren, gesorteerd op fabrikant.

Als u een monitor wilt selecteren, bladert u door de lijst naar de fabrikant van uw monitor of typt u de eerste letters van de naam van de fabrikant tot de betreffende fabrikant in de lijst wordt gemarkeerd. Klik op het plus-teken (+) en selecteer uw monitor.

Als uw monitor niet in de lijst voorkomt en u hebt van de fabrikant een diskette gekregen, kunt u de knop 'Diskette' gebruiken.

U kunt alleen een monitor uit de lijst selecteren als de optie 'Selecteren uit lijst' is geselecteerd.

De selectie van een monitor wordt effectief als u klikt op de knop 'Toepassen' of 'OK'.

Als de huidige videomodus niet door de geselecteerde monitor wordt ondersteund, wordt de resolutie/herhalingsfrequentie verminderd.


Geeft de monitor weer die momenteel aan het systeem is toegewezen.

Als u een nieuwe monitor selecteert, wordt de wijziging pas van kracht als u op de knop 'Toepassen' of 'OK' hebt geklikt.


Als u deze optie selecteert, kunt u de volledige resolutie/herhalingsfrequentie-mogelijkheden van de videochip kiezen.

U kunt uw aangepaste modi selecteren via de Beeldscherminstellingen op de tab Instellingen.

Waarschuwing: als u een resolutie of een herhalingsfrequentie kiest die niet door uw monitor wordt ondersteund, kan dit uw monitor onherstelbaar beschadigen.


Als u deze optie selecteert, kunt u de volledige resolutie/herhalingsfrequentie-mogelijkheden van de videochip kiezen.

Waarschuwing: als u een resolutie of een herhalingsfrequentie kiest die niet door uw monitor wordt ondersteund, kan dit uw monitor onherstelbaar beschadigen.


Als u deze optie selecteert, kunt u handmatig een monitor selecteren uit onderstaande lijst.


Als u deze optie selecteert, wordt de monitorlijst uitgeschakeld.

Nadat u op de knop 'Toepassen' of 'OK' hebt geklikt, zal het systeem zoeken naar een DDC-monitor zodra het opnieuw wordt opgestart.

Als u direct een nieuwe DDC-monitor wilt zoeken, klikt u op knop 'Nu zoeken'.


Deze knop is alleen beschikbaar als de optie 'Selecteren uit lijst' is geselecteerd.

Als u een diskette hebt gekregen van de fabrikant van uw monitor, kunt u deze importeren in de algemene monitorlijst.

U doet dit door op deze knop te klikken en een directory of bestand te selecteren met de informatie over uw monitor. Selecteer vervolgens uw monitor en klik op de knop 'Toepassen' of 'OK'.


Deze knop is alleen beschikbaar als de optie 'PnP-monitor' is geselecteerd.

Als u op deze knop klikt, gaat het systeem direct zoeken naar een DDC-monitor. Als geen DDC-monitor wordt gevonden, wordt een foutmelding weergegeven.


Geeft een lijst met resoluties weer, gevolgd door de maximale herhalingsfrequentie per resolutie, die door de huidig geselecteerde monitor worden ondersteund.


Deze knop wordt weergegeven als de monitorlijst de inhoud van de diskette van de fabrikant toont.

Klik op deze knop als u de interne monitorlijst wilt zien.


De helderheid van het beeld is evenredig aan de invoervoltage die door de stroomgamma wordt geproduceerd. Deze niet-lineaire toestand moet worden gecompenseerd om de juiste helderheid van de afbeelding te bereiken. Het beeldschermgamma maakt de middentonen donkerder in verhouding tot de donkere en lichte gebieden. De aanpassing van de gammacorrectie heeft effect op de gehele schermweergave. Het instellingenbereik loopt van 03 – 4.0.

Klik op de knop “>1<” om de standaardinstelling 1.0 in te stellen.

De aanpassing van de gammacorrectie kan niet worden toegepast in de 256-kleuren modus.


Wijzigt de herhalingsfrequentie van de beeldschermadapter. Hoe hoger de herhalingsfrequentie, hoe minder uw scherm flikkert.