Viser en liste over tilgjengelige skjermer sortert etter produsent.

Du velger en skjerm ved å rulle til produsenten av skjermen din eller skrive den første bokstaven i produsentens navn helt til produsenten er uthevet på listen. Klikk på ‘+’-tegnet og velg skjermen din.

Hvis skjermen din ikke står på listen, og du har en diskett fra produsenten, kan du bruke knappen ‘Har diskett’.

Du kan bare velge en skjerm fra listen hvis alternativet ‘Velg fra liste’ er valgt!

Valget av skjerm vil tre i kraft når du klikker på knappen ‘Bruk’ eller ‘OK’.

Hvis den gjeldende skjermmodusen ikke støttes av skjermen du har valgt, vil oppløsningen/oppdateringsfrekvensen bli redusert.


Viser skjermen som er tildelt systemet.

Hvis du velger en ny skjerm, vil ikke endringen tre i kraft før du klikker på knappen ‘Bruk’ eller ‘OK’.


Hvis du velger dette alternativet, kan du utnytte maksimal oppløsning/oppdateringsfrekvens i skjermbrikken.

Bruk fanen Innstillinger i Egenskaper for Skjerm for å velge de tilpassede modiene.

Advarsel: Hvis du velger en oppløsning eller oppdateringsfrekvens som skjermen ikke støtter, kan du ødelegge skjermen permanent.


Hvis du velger dette alternativet, kan du utnytte maksimal oppløsning/oppdateringsfrekvens i skjermbrikken.

Advarsel: Hvis du velger en oppløsning eller oppdateringsfrekvens som skjermen ikke støtter, kan du ødelegge skjermen permanent.


Hvis du velger dette alternativet, kan du velge en skjerm manuelt fra listen nedenfor.


Hvis du velger dette alternativet, deaktiverer du skjermlisten.

Når du klikker på knappen ‘Bruk’ eller ‘OK’, prøver systemet å finne en DDC-skjerm ved hver oppstart.

Hvis du vil søke etter en ny DDC-skjerm med en gang, klikker du på knappen ‘Finn nå’.


Denne knappen kan bare brukes hvis alternativet ‘Velg fra liste’ er valgt.

Hvis du har en diskett fra skjermprodusenten, kan du importere skjermen til den globale skjermlisten.

Det gjør du ved å klikke på denne knappen og velge en katalog eller en fil som inneholder informasjon om skjermen din. Deretter velger du skjermen og klikker på knappen ‘Bruk’ eller ‘OK’.


Denne knappen kan bare brukes hvis alternativet ‘PnP-skjerm’ er valgt.

Hvis du klikker på denne knappen, prøver systemet umiddelbart å finne en DDC-skjerm. Hvis det ikke er tilkoblet noen DDC-skjerm, blir det vist en feilmelding.


Viser en liste med oppløsninger, fulgt av den maksimale oppdateringsfrekvensen for hver oppløsning som støttes av skjermen som er valgt.


Denne knappen blir vist når skjermlisten viser innholdet på en produsentdiskett.

Klikk på denne knappen for å få frem den interne skjermlisten igjen.


Lysstyrken som produseres på skjermflaten, er proporsjonal med spenningen inn til skjermen, opphøyd i gamma. Denne ikke-lineære egenskapen må kompenseres for å oppnå korrekt reproduksjon av bildets lysstyrke. Effekten av skjermgamma er å gjøre de midtre fargetonene mørkere i forhold til de mørke og lyse områdene. Justeringen av gammakorrigeringen påvirker hele skjermen. Mulige verdier er i området 0.3 - 4.0.

Klikk på knappen “>1<” for å velge standardverdien 1.0.

Justeringen av gammakorrigering kan ikke brukes i modus med 256 farger.


Endrer oppdateringsfrekvensen til skjermkortet. Jo høyere oppdateringsfrekvens, desto mindre flimring på skjermen.