Visar en lista med tillgängliga bildskärmar sorterade efter tillverkare.

Välj en bildskärm genom att bläddra till bildskärmens tillverkare eller ange den första bokstaven i tillverkarens namn tills tillverkaren är markerad i listan. Klicka på "+"-tecknet och markera bildskärmen.

Om bildskärmen inte finns i listan och du har en diskett från tillverkaren kan du använda knappen Diskett finns.

Du kan bara välja en bildskärm i listan om alternativet Välj från listan är markerat.

Bildskärmsvalet träder i kraft när du klickar på knappen Verkställ eller OK.

Om det aktuella bildskärmsläget inte stöds av den markerade bildskärmen minskas upplösningen/uppdateringshastigheten.


Visar den bildskärm som för närvarande är tilldelad till systemet.

Om du väljer en ny bildskärm träder förändringen inte i kraft förrän du klickar på knappen Verkställ eller OK.


Om du väljer det här alternativet kan du välja grafikchipsets maximala upplösning/uppdateringshastighet.

Välj egna lägen på fliken Inställningar i Inställningar för Bildskärm.

Varning! Om du väljer en upplösning eller uppdateringsfrekvens som inte stöds av bildskärmen kan bildskärmen skadas.


Om du väljer det här alternativet kan du välja grafikchipsets maximala upplösning/uppdateringshastighet.

Varning! Om du väljer en upplösning eller uppdateringsfrekvens som inte stöds av bildskärmen kan bildskärmen skadas.


Om du väljer det här alternativet kan du välja en bildskärm manuellt i listan nedan.


Om du väljer det här alternativet avaktiveras bildskärmslistan.

När du klickar på knappen Verkställ eller OK försöker systemet identifiera en DDC-bildskärm vid varje omstart.

Om du vill identifiera en ny DDC-bildskärm omedelbart klickar du på knappen Identifiera nu.


Knappen är bara tillgänglig om alternativet Välj från lista är markerat.

Om du har fått en diskett från tillverkaren av bildskärmen kan du importera den till den globala bildskärmslistan.

Du gör det genom att klicka på den här knappen och sedan välja den katalog eller fil som innehåller information om bildskärmen. Markera sedan bildskärmen och klicka på Verkställ eller OK.


Knappen är bara tillgänglig om alternativet PnP-bildskärm är markerat.

Om du klickar på knappen görs omedelbart ett försök att identifiera en DDC-bildskärm. Om ingen DDC-bildskärm är ansluten visas ett felmeddelande.


Visar en lista med upplösningar, följt av den högsta uppdateringsfrekvensen för varje upplösning, som stöds av den aktuella bildskärmen.


Knappen visas när bildskärmslistan visar innehållet på en diskett från en tillverkare.

Klicka på den här knappen om du vill visa den interna bildskärmslistan igen.


Den ljusstyrka som genereras på bildskärmens framsida står i proportion till den ingående spänningen upphöjd i gamma. Den här icke-linjäriteten måste kompenseras för att uppnå korrekt återgivning av bildens ljusstyrka. Bildskärmsgamma gör mellantonerna mörkare relativt de mörka och ljusa områdena. Gammakorrigeringen påverkar hela bildskärmsytan. Det möjliga inställningsintervallet är 0,3 - 4,0.

Klicka på knappen >1< om du vill ange standardinställningen 1,0.

Gammakorrigeringen kan användas i 256-färgsläge.


Ändrar grafikkortets uppdateringsfrekvens. Ju högre uppdateringsfrekvens, desto mindre flimmer ser du på skärmen.