在一个监视器图标上单击来辨认其位置。


在一个监视器图标上单击来辨认其位置。


选择是在当前监视器──鼠标当前所在的显示器──上实行全屏显示，还是在所有监视器上实行分屏显示。


选择是否要把可调整大小的窗口移动到窗口左上角当前所在的监视器上。


选择是否想让通常出现在屏幕中央的 Windows 信息显示在某一特定监视器上。 这能让其它监视器的屏幕区域完全用于工作。


选中此选项将允许您选择双监视器配置的分辨率。

不选此选项将只能选择单监视器的分辨率。

如果当前选中多监视器模式，当您按下“应用”或“确定”按钮时，将自动切换到单监视器模式。


选中此选项将允许您选择双监视器配置的分辨率。

在这种情况下，监视器对话框中的选项（隐藏了监视器不能显示的模式）未选中。

在多监视器配置下，不要人工选择此选项！

要改变监视器类型，请用ATI的监视器对话框。

不选此选项将只能选择单监视器的分辨率。

如果当前选中多监视器模式，当您按下“应用”或“确定”按钮时，将自动切换到单监视器模式。

ATI的监视器对话框被禁用