用滑鼠左鍵按一下顯示器符號以確認它的位置。


用滑鼠左鍵按一下顯示器符號以確認它的位置。


如果您要在目前的顯示器上 (游標目前所在的顯示器) 做全螢幕顯示，或是在全部顯示器上作分割畫面，請選取這個選項。


如果您要讓可調整大小的視窗移到顯示器 (目前視窗的左上角) 上，請選取這個選項。


如果您要讓通常顯示在螢幕中央的 Windows 訊息顯示在特定的顯示器上，請選取這個選項。這樣就可以空出其他顯示器的螢幕區域來工作。


選中此選項將允許您選擇雙監視器配置的解析度。

不選此選項將只能選擇單監視器的解析度。

如果當前選中多監視器模式，當您按下“應用”或“確定”按鈕時，將自動切換到單監視器模式。


選中此選項將允許您選擇雙監視器配置的解析度。

在這種情況下，監視器對話框中的選項（隱藏了監視器不能顯示的模式）未選中。

在多監視器配置下，不要人工選擇此選項！

要改變監視器類型，請用ATI的監視器對話框。

不選此選項將只能選擇單監視器的解析度。

如果當前選中多監視器模式，當您按下“應用”或“確定”按鈕時，將自動切換到單監視器模式。

ATI的監視器對話框被禁用