Venstreklik på et skærmsymbol for at angive placeringen.


Venstreklik på et skærmsymbol for at angive placeringen.


Marker, om du vil have visning af fuld skærm på den aktuelle skærm, dvs. den skærm, hvor musemarkøren befinder sig aktuelt, eller om du vil dele på alle skærme.


Vælg, om du vil flytte de vinduer, der kan ændres i størrelsen, til skærmen, hvor vinduets øverste venstre hjørne aktuelt befinder sig.


Vælg, om de Windows-meddelelser, der normalt vises midt på skærmen, skal vises på en bestemt skærm. Dermed kan du undgå disse meddelelser på de andre skærme.


Vælger du denne option, har du mulighed for at vælge billedopløsninger til en dobbelt-monitor konfiguration.

Fravalg af denne option giver kun mulighed for enkelt-monitor billedopløsninger.

Når du imidlertid vælger multi-monitor mode, skiftes automatisk til enkelt-monitor, når du trykker på ‚Apply‘ eller ‚OK‘ knappen.


Vælger du denne option, har du mulighed for at vælge billedopløsninger til en dobbelt-monitor konfiguration.

I dette tilfælde bliver optionen fravalgt i monitorpanelet, som skjuler de modes, som monitoren ikke kan vise.

Du må aldrig vælge denne option manuelt ved en multi-monitor konfiguration!

Brug ATI monitorpanelet til ændring af monitortype.

Fravalg af denne option giver kun mulighed for enkelt-monitor billedopløsninger.

Når du imidlertid vælger multi-monitor mode, skiftes automatisk til enkelt-monitor, når du trykker på ‚Apply‘ eller ‚OK‘ knappen.

ATI monitorpanelet kan ikke anvendes.