Click with the left mouse button on a monitor symbol to identify its position.


Click with the left mouse button on a monitor symbol to identify its position.


Select if you want the full screen display on the current monitor - that is the monitor where your mouse cursor currently is, or split on all monitors.


Select if you want resizeable windows moved to the monitor, where the upper left corner of the window currently is.


Select if you want Windows messages that normally display in the center of the screen shown on a  specific monitor. This keeps the screen area of the other monitors free for your work.


Selecting this option will allow you to select resolutions for a two-monitor configuration.

Deselecting this option will select single monitor resolutions only.

If  a multi-monitor mode is currently selected, it will automatically change to single-monitor, when

you press the ‚Apply‘ or ‚OK‘ button.


Selecting this option will allow you to select resolutions for a two-monitor configuration.

In this case the option in the monitor panel, hiding the modes that the monitor cannot display, is deselected.

Never select this option manually with a multi-monitor configuration!

To change the monitor type, use the ATI monitor panel.

Deselecting this option will select single monitor resolutions only.

If  a multi-monitor mode is currently selected, it will automatically change to single-monitor, when

you press the ‚Apply‘ or ‚OK‘ button.

The ATI monitor panel is disabled.