Haga clic en el símbolo de un monitor para identificar su posición.


Haga clic en el símbolo de un monitor para identificar su posición.


Seleccione si desea obtener la presentación de pantalla completa en el monitor actual, es decir, el monitor donde se encuentra actualmente el cursor del ratón, o bien dividida en todos los monitores.


Seleccione si desea mover las ventanas ajustables al monitor, donde se encuentra actualmente la esquina superior izquierda de la ventana.


Seleccione si desea ver los mensajes de Windows que normalmente aparecen en el centro de la pantalla en un monitor concreto. De esta forma se mantiene libre el área de pantalla del resto de los monitores para poder trabajar.


Seleccionando esta opción se le permitirá elegir resoluciones para una configuración de dos monitores.

De no elegir esta opción, solo seleccionará resoluciones para un monitor.

Si se encuentra seleccionado el modo de múltiples monitores, cambiará automáticamente al modo de un solo monitor, cuando

 pulse el botón ”Aplicar” o ”Aceptar”.


Activar esta opción le permite elegir resoluciones para una configuración de dos monitores.

En este caso, la opción en el panel del monitor, quedando ocultos los modos que el monitor no puede visualizar, no es seleccionada.

¡Nunca seleccione esta opción manualmente con una configuración de múltiples monitores!

Para cambiar el tipo de monitor, utilice el panel del monitor ATI.

Seleccionando esta opción se le permitirá elegir resoluciones para un solo monitor.

Si se encuentra seleccionado el modo de múltiples monitores, cambiará automáticamente al modo de un solo monitor, cuando

 pulse el botón ”Aplicar” o ”Aceptar”.

El panel del monitor ATI se encuentra desactivado.