Määritä näytön sijainti napsauttamalla sitä hiiren vasemmanpuoleisella painikkeella.


Määritä näytön sijainti napsauttamalla sitä hiiren vasemmanpuoleisella painikkeella.


Valitse, haluatko koko näytön nykyiseen näyttöön (jossa hiiren osoitin on nyt) vai jaetuksi kaikkien näyttöjen välillä.


Valitse, haluatko siirtää ikkunat, joiden kokoa voidaan muuttaa, siihen näyttöön, jossa ikkunan vasen yläreuna on nyt.


Valitse, haluatko tavallisesti näytön keskelle tulevien Windowsin sanomien näkyvän jossakin tietyssä näytössä. Näin voit vapauttaa muut näytöt muuta käyttöä varten.


Met behulp van deze opties kunt u de resoluties voor een dubbele beeldschermconfiguratie kiezen.

Wanneer deze optie is gedeactiveerd, kan uitsluitend de resolutie voor een enkele monitor worden geselecteerd.

Wanneer eerder een meervoudige monitormodus werd geselecteerd, wordt automatisch omgeschakeld naar de enkelvoudige monitor wanneer u de op knop "Toepassen" of "OK" drukt.


Met behulp van deze optie kunt u de resoluties voor een dubbele beeldschermconfiguratie kiezen.

In dat geval is de optie op het bedieningsveld van de monitor, welke de modi verbergt die de monitor niet kan weergeven, gedeactiveerd!

Gebruik het monitor bedieningsveld van ATI wanneer u het type monitor wilt wijzigen.

Wanneer deze optie is gedeactiveerd, kan uitsluitend de resolutie voor een enkele monitor worden geselecteerd.

Wanneer eerder een meervoudige monitormodus werd geselecteerd, wordt automatisch omgeschakeld naar de enkelvoudige monitor wanneer u de op knop "Toepassen" of "OK" drukt.

Het monitor bedieningsveld van ATI is gedeactiveerd.