Fare clic sull’icona dello schermo per individuarne la posizione.


Fare clic sull’icona dello schermo per individuarne la posizione.


Attiva la visualizzazione a schermo intero per lo schermo corrente, ovvero lo schermo su cui è posizionato il mouse, o suddivide la visualizzazione tra i vari schermi.


Consente di posizionare le finestre ridimensionabili sullo schermo su cui si trova l’angolo superiore sinistro della finestra.


Consente di visualizzare su uno schermo specifico i messaggi di Windows visualizzati normalmente al centro dello schermo. In questo modo l’area degli altri schermi sarà disponibile per altre attività.


Attivando questa opzione è possibile selezionare le risoluzioni per la configurazione a due monitor.

Disattivando l'opzione, sarà possibile selezionare solo le risoluzioni per un singolo monitor.

Se è stata attualmente attivata la modalità multi-monitor, premendo il pulsante ‚Applica‘ o ‚OK‘ verrà attivata automaticamente la modalità a un solo monitor.


Attivando questa opzione è possibile selezionare le risoluzioni per la configurazione a due monitor.

In questo caso l'opzione del pannello del monitor è deselezionata e appaiono disattivate le modalità che il monitor non è in grado di visualizzare.

Non selezionare mai questa opzione manualmente in presenza di una configurazione multi-monitor!

Per cambiare tipo di monitor, utilizzare il pannello del monitor ATI.

Disattivando l'opzione, sarà possibile selezionare solo le risoluzioni per un singolo monitor.

Se è stata attualmente attivata la modalità multi-monitor, premendo il pulsante ‚Applica‘ o ‚OK‘ verrà attivata automaticamente la modalità a un solo monitor.

Il pannello del monitor ATI è disattivato.