モニタ・アイコンをマウスの左ボタンでクリックして、位置を識別します。


モニタ・アイコンをマウスの左ボタンでクリックして、位置を識別します。


マウス・カーソルのあるモニタ、またはすべてのモニタを全画面表示にします。


画面の左上のモニタに、サイズの変更可能なウィンドウを移動します。


通常は画面の中央に表示されるウィンドウのメッセージを、特定のモニタに表示させます。別のモニタでの作業を妨げません。


このオプションを選択すると、２モニタ環境について解像度を設定できます。

このオプションを選択しない場合、シングル モニタ環境で解像度を設定することになります。

マルチモニタ モードが現時点で選択されている場合に［適用］または［ＯＫ］ボタンをクリックすると、自動的にシングル モニタ環境に変更されます。


このオプションを選択すると、２モニタ環境について解像度を設定できます。

その場合、モニタが表示できないモードを隠すオプションが［モニタ］タブで選択されません。

マルチモニタ環境でこのオプションをマニュアルで選択することは、絶対にすべきではありません。

モニタの種類は、 ATI ［モニタ］タブで変更できます。

このオプションを選択しない場合、シングル モニタ環境で解像度を設定することになります。

マルチモニタ モードが現時点で選択されている場合に［適用］または［ＯＫ］ボタンをクリックすると、自動的にシングル モニタ環境に変更されます。

ATI ［モニタ］タブは、利用できません。