모니터 기호에서 마우스 왼쪽 단추를 눌러 위치를 식별합니다.


모니터 기호에서 마우스 왼쪽 단추를 눌러 위치를 식별합니다.


현재 모니터, 즉 지금 마우스 커서가 있는 모니터에 전체 화면을 표시하거나 모든 모니터에 전체 화면을 분할해서 표시하려면 선택합니다.


현재 창의 상단 왼쪽이 있는 모니터로 크기를 바꿀 수 있는 창을 이동하려면 선택합니다.


일반적으로 화면 중앙에 표시되는 Windows 메시지를 특정한 모니터에 표시하려면 선택합니다. 그러면 다른 모니터의 화면 영역에 사용자의 작업이 표시되지 않습니다.


이 옵션으로 이중화면구성을 위한 해상도를 선택할 수 있습니다.

이 옵션이 비활성화 되면, 각각 단일모니터의 해상도만을 선택할 수 있습니다.

다중모니터모드를 선택하기 전에 연결창의 �적용�이나 �확인�을 누르면, 자동으로 단일모니터운영으로 변환됩니다.


이 옵션으로 이중화면구성을 위한 해상도를 선택할 수 있습니다.

모니터에 나타나지 않아 모드가 숨겨진 경우 모니터제어판의 옵션은 비활성화 됩니다.!

모니터의 타입을 변경하려면,  ATI의 모니터제어판을 이용하십시오.

이 옵션이 비활성화 되면, 각각 단일모니터의 해상도만을 선택할 수 있습니다..

다중모니터모드를 선택하기 전에 연결창의 �적용�이나 �확인�을 누르면, 자동으로 단일모니터운영으로 변환됩니다.

ATI의 모니터제어판은 비활성화 되었습니다.