Klik met de linkermuisknop op een monitorsymbool om de positie ervan te bekijken.


Klik met de linkermuisknop op een monitorsymbool om de positie ervan te bekijken.


Selecteer deze optie als u volledige schermweergave wilt op de huidige monitor (de monitor waar de muiscursor momenteel staat), of als u op alle monitoren gesplitste schermweergave wilt.


Selecteer deze optie als u vensters waarvan het formaat kan worden gewijzigd, wilt verplaatsen naar de monitor waar de linkerbovenhoek van het venster zich momenteel bevindt.


Selecteer deze optie als u Windows-berichten, die normaliter worden weergegeven in het midden van het scherm, op een specifieke monitor wilt laten weergeven. Op die manier houdt u het schermgebied van de andere monitoren vrij voor uw werkzaamheden.


Met behulp van deze opties kunt u de resoluties voor een dubbele beeldschermconfiguratie kiezen.

Wanneer deze optie is gedeactiveerd, kan uitsluitend de resolutie voor een enkele monitor worden geselecteerd.

Wanneer eerder een meervoudige monitormodus werd geselecteerd, wordt automatisch omgeschakeld naar de enkelvoudige monitor wanneer u de op knop "Toepassen" of "OK" drukt.


Met behulp van deze optie kunt u de resoluties voor een dubbele beeldschermconfiguratie kiezen.

In dat geval is de optie op het bedieningsveld van de monitor, welke de modi verbergt die de monitor niet kan weergeven, gedeactiveerd!

Gebruik het monitor bedieningsveld van ATI wanneer u het type monitor wilt wijzigen.

Wanneer deze optie is gedeactiveerd, kan uitsluitend de resolutie voor een enkele monitor worden geselecteerd.

Wanneer eerder een meervoudige monitormodus werd geselecteerd, wordt automatisch omgeschakeld naar de enkelvoudige monitor wanneer u de op knop "Toepassen" of "OK" drukt.

Het monitor bedieningsveld van ATI is gedeactiveerd.