Klikk med venstre museknapp på et skjermsymbol for å definere posisjonen.


Klikk med venstre museknapp på et skjermsymbol for å definere posisjonen.


Velg om du vil vise hele skjermbildet på den gjeldende skjermen, det vil si skjermen der musemarkøren er, eller om du vil fordele det på alle skjermene.


Velg om du vil at vinduer som størrelsen kan endres på, skal flyttes til skjermen der øverste venstre hjørne av vinduet er nå.


Velg om du vil at Windows-meldinger som vanligvis blir vist midt på skjermen, skal vises på en bestemt skjerm. Da kan du bruke skjermområdene til de andre skjermene uten forstyrrelser.


Med hjelp av denne opsjonen kan du velge ut oppløsningene for en konfigurasjon med dobbelt bildeskjerm.

Når denne opsjonen er deaktivert, kan kun oppløsningen for en enkelt monitor velges.

Hvis det tidligere er valgt en modus med flere bildeskjermer, koples det automatisk om til drift med enkel monitor når du trykker på styrefelt 'Bekreft' eller 'OK'.


Med hjelp av denne opsjonen kan du velge oppløsningene for en konfigurasjon med dobbelt bildeskjerm.

I dette tilfellet er den opsjonen på styrefeltet i monitoren deaktivert som skjuler de modi som monitoren ikke kan vise!

Bruk monitor-styrefeltet fra ATI, hvis du vil endre din type monitor.

Hvis denne opsjonen er deaktivert, kan kun oppløsningen for en enkelt monitor velges.

Hvis en modus med flere monitorer er blitt valgt tidligere, koples det automatisk om til drift med enkel monitor, når du trykker på styrefelt 'Bekreft' eller 'OK'.

Monitor-styrefeltet fra ATI  er deaktivert.