Klicka med vänster musknapp på en bildskärm för att identifiera dess läge.


Klicka med vänster musknapp på en bildskärm för att identifiera dess läge.


Välj om du vill använda helskärmsläge på den aktuella bildskärmen, dvs den bildskärm där musmarkören finns, eller om du vill dela bilden över alla bildskärmar.


Välj om du vill att fönster som du kan ändra storlek på ska flyttas till den bildskärm där fönstrets övre vänstra hörn är.


Välj om du vill att Windows-meddelanden som normalt visas mitt på skärmen ska visas på någon speciell bildskärm. På så sätt håller du bildskärmsytan på de andra bildskärmarna fria för arbete.


Med hjälp av detta alternativ kan du välja upplösningarna för en tvåbildskärmskonfiguration.

Om detta alternativ är avaktiverat, kan upplösningen endast väljas för en enskild bildskärm.

Om en multi-bildskärmsarbetsmetod har valts, kopplas automatiskt om till enskildbildskärmsdrift, om du trycker knapparna ‚Använd‘ eller ‚OK‘.


Med hjälp av detta alternativ kan du välja upplösningarna för en tvåbildskärmskonfiguration.

In this case the option in the monitor panel, hiding the modes that the monitor cannot display, is deselected.

Never select this option manually with a multi-monitor configuration!

Använd bildskärmsmanöverpanelen av ATI om du vill ändra din bildskärmstyp.

Om detta alternativ är avaktiverat, kan upplösningen endast väljas för en enskild bildskärm.

Om en multi-bildskärmsarbetsmetod har valts, kopplas automatiskt om till enskildbildskärmsdrift, om du trycker knapparna ‚Använd‘ eller ‚OK‘.

Bildskärmsmanöverpanelen av ATI är avaktiverad.