Copyright: Windows NT 4.0 桌面帮助, � ATI Technologies Inc.  Tuesday, March 02, 1999 12:07:01, Version H6.01
Citation: Windows NT 4.0 桌面帮助, � ATI Technologies Inc., Version H6.01


告诉我如何...

  在平面面板上扩展显示区域

  调整平面面板显示亮度

  返回“快速入门”窗口

  取得更详细信息


 平面面板显示功能

告诉我如何…

  启动/关闭平面面板显示

  更改平面面板显示的显示模式

  扩展平面面板显示的显示区域

  调整平面面板显示亮度

  返回“快速入门”窗口

  取得更详细信息


在平面面板上扩展显示区域
 平面面板属性

在平面面板上扩展显示区域

1	单击此处 [image] 查看“显示器属性”。

2	单击“显示器”标签。

3	单击“平面面板”按钮。

您必须先启动平面面板才能更改其显示属性。单击此处 以获取更详细信息。

4	单击“将图象缩放至面板大小”按钮。

5	单击“确定”或“应用”以保存所做的更改。

注意

  按此按钮将扩展显示器至平面面板固定的象素数目。例如，若显示 320 x 200 模式至 800 x 600 平面面板，则显示器会扩展至 800 x 600。

  这个功能只有在平面面板设置为主要显示模式时才可用。单击此处 取得更多如何更改平面面板显示模式的详细信息。

 相关主题


调整平面面板显示的亮度
 平面面板属性

调整平面面板显示的亮度

1	单击此处 [image] 查看“显示器属性”。

2	单击“显示器”标签。

3	单击“平面面板”按钮。

您必须先启动平面面板才能更改其显示属性。单击此处 以获取更详细信息。

4	拖曳滑杆以调整平面面板的亮度

5	单击“确定”或“应用”以保存所做的更改。

注意

  这个功能只在一些高对比度的平面面板显示器上可用。

 相关主题


将平面面板的亮度设置重设为默认值
 平面面板属性

将平面面板的亮度设置重设为默认值

1	单击此处 [image] 查看“显示器属性”的“设置”标签。

2	单击“显示器”标签。

3	单击“平面面板”按钮。

您必须先启动平面面板才能更改其显示属性。单击此处 以获取更详细信息。

4	单击“默认值”按钮。

5	单击“确定”或“应用”以保存所做的更改。

注意

   这个功能只在一些高对比度的平面面板显示器上可用。

 相关主题


拖曳滑杆以调整平面面板亮度。


显示您平面面板最大支持的分辨率和刷新频率。


单击此按钮以启动“将图象缩放至面板大小”，显示器会扩展至平面面板实际所有的象素数目。例如：若显示 320 x 200 模式至 800 x 600 平面面板，则显示器会扩展至 800 x 600。


单击此按钮将“亮度”滑杆重设回默认值。


您的图形加速卡允许您在独特显示模式中，以独特分辨率和刷新率显示屏幕上内容。