Copyright: Windows NT 4.0 桌面帮助, � ATI Technologies Inc.  Friday, July 16, 1999 09:15:02, Version H6.01
Citation: Windows NT 4.0 桌面帮助, � ATI Technologies Inc., Version H6.01


如何...

  添加或删除颜色控制点

  更改桌面颜色

  调整桌面颜色的亮度

  调整视频覆盖窗口颜色的亮度

  返回快速入门

  获取更多详细信息


调整桌面颜色的亮度
 颜色

调整桌面颜色的亮度

1	单击此处 [image] 查看“显示器属性”。

2	单击“颜色”标签。

3	在“亮度”区域下，将桌面滑杆向右拖曳（增加）或向左拖曳（降低）显示器的亮度。

4	单击“确定”或“应用”按钮以保存您所做的更改。

 相关主题


调整视频覆盖窗口颜色的亮度
 颜色

调整视频覆盖窗口颜色的亮度

1	单击此处 [image] 查看“显示器属性”。

2	单击“颜色”标签。

3	在“亮度”区域下，将覆盖滑杆向右拖曳（以增加）或向左拖曳（以降低）视频覆盖窗口的亮度。

4	单击“确定”或“应用”按钮以保存您所做的更改。

 相关主题


 颜色

调整视频覆盖窗口颜色的亮度

1	单击此处 [image] 查看“显示器属性”。

2	单击“颜色”标签。

3	在“亮度”区域下，将覆盖滑杆向右拖曳（以增加）或向左拖曳（以降低）视频覆盖窗口的亮度。

4	单击“确定”或“应用”按钮以保存您所做的更改。

注意

  此功能仅在您开启的覆盖窗口县示设备设置为主要县示模式时可用。单击此处 以获取如何更改县示模式的信息。

 相关主题


更改桌面的颜色
 颜色

调整屏幕的颜色

1	单击此处 [image] 查看“显示器属性”。

2	单击“颜色”标签。

3	在“颜色曲线”范围内，单击与所要求颜色组件颜色组件（红、绿、蓝）相对应的圆按钮。

4	将鼠标器光标移到控制点上，再单击鼠标器左按钮。

5	按住按钮同时，将控制点拖曳到新位置。

6	单击“确定”或“应用”按钮以保存新颜色设置。

注意

  不可将点拖越过曲线上另一相邻点。

  不可将最左端点从底边向上拖曳。

  不可将最右端点从顶边向下拖曳。

 相关主题


添加/删除颜色更正控制点
 颜色

添加/删除颜色更正控制点

1	单击此处 [image] 查看 “显示器属性”。

2	单击“颜色”标签。

3	在“颜色曲线”范围内，单击与所要求颜色组件（红、绿、蓝）相对应的圆按钮。

4	欲添加控制点，请在所要求颜色曲线上单击鼠标器光标同时，按住 SHIFT 键。

会有控制点出现在颜色曲线上选定点处。

5	欲删除控制点，在该点上单击鼠标器光标同时，按住 CTRL 键。

控制点会从颜色曲线上消失。

6	单击“确定”或“应用”按钮以保存您所做的更改。

提示

  添加、删除或移动控制点时，便可使色调平滑或加强其梯度。

 相关主题


将颜色设置重设为默认值
 颜色

将颜色设置重设为默认值

1	单击此处 [image] 查看“显示器属性”。

2	单击“颜色”标签。

3	单击“默认值”按钮。

4	单击“确定”或“应用”按钮以保存您所做的更改。

 相关主题


单击此按钮将颜色设置还原为默认值。


颜色更正

此功能可更正真正颜色值与屏幕显示颜色之间的差异。颜色差异可能由各种来源所造成，包括：

  工作区域照明情况

  监视器或平面显示器中的颜色移位


颜色曲线

颜色曲线代表所有对应颜色组件颜色组件（红、绿、或蓝）的浓度值（从 0 到 255）。每一颜色曲线的平行轴均代表输入值（即 Windows 程序欲显示的颜色值），而垂直轴代表输出值（即显示器驱动程序会写入屏幕的颜色值）。0 值（位于左下角）代表某特定颜色最暗的色调，而 255 值（位于右上角）则代表该颜色最浅的色调。


颜色组件

三个颜色组件 - 红、绿及蓝 - 会结合成各种浓度以决定屏幕上每个象素的颜色。每个颜色组件的各个数值均由对应颜色曲线.图形形式表示出来。


控制点

控制点是用户在颜色曲线上创建的点。利用鼠标器可移动控制点以更改屏幕颜色。


颜色深度/bpp

可用的颜色数或深度，是取决于与每一象素相关的位数目以代表该象素的颜色。此为特定的 bpp (bits per pixel) 设置。一些常用的数值为：

  8 bpp � 给予 256 颜色

  16 bpp - 给予 65K 颜色

  32 bpp - 给予 16.7M 颜色


增加或降低显示器颜色的亮度和对比度。Gamma 值愈高，显示器的亮度和对比度就愈高，最高设置为平面（未修改的）设置。


作为调整颜色设置的视觉辅助。


通过鼠标器移动颜色曲线上的控制点时，会调整所选定颜色组件（红、绿、或蓝）。


增加或降低视频覆盖窗口颜色的亮度和对比度。Gamma 值愈高，显示器的亮度和对比度就愈高，最高设置为平面（未修改的）设置。


单击此按钮以选取想要的颜色组件，以便移动颜色曲线上的控制点以调整颜色。


图形加速器允许您在明显显示方式内显示屏幕上内容，其包含明显分辨率和刷新频率。


 设置

欢迎光临桌面帮助系统！

本帮助系统是您对产品特性的单点访问。

如果这是您第一次安装本产品，也许会需要花几分钟时间，跟随安装程序熟悉其增强功能。

单击此处 [image] 开始安装。


帮助版本
 桌面帮助

查看“帮助版本”

单击此处 [image] 查看“帮助版本”。


 快速入门...

设置显示器属性

新显示器驱动程序安装好之后，可能需要花一点时间熟悉图形加速器的增强特性。

若需有关使用帮助的信息，请在“帮助”作业期间随时按 F1 键。

告诉我如何...

  更改最高屏幕分辨率

  调整屏幕位置

  调整屏幕大小

  设置颜色更正控制

  获取更详细信息

  下一次启动 Windows 时显示此屏幕


 快速入门...

设置显示器属性

新显示器驱动程序安装好之后，可能需要花一点时间熟悉图形加速器的增强特性。

若需有关使用帮助的信息，请在“帮助”作业期间随时按 F1键。

告诉我如何...

  更改最高屏幕分辨率

  调整屏幕位置

  调整屏幕大小

  设置颜色更正控制

  获取更详细信息

  下一次启动 Windows 时显示此屏幕


告诉我如何...

  保存显示配色方案

  删除显示配色方案

  调用显示配色方案

  指定显示配色方案热键

 启动/关闭显示装置

  更改显示设备的显示模式

  返回“快速入门”

  获取更详细信息


 显示器

保存显示配色方案

1	单击此处 [image] 查看“显示器属性”。

2	单击“显示器”标签。

3	单击“配色方案”框

4	输入显示配色方案的名称，然后单击“保存”。

此举便保存每个显示设备当前的配置(例如，不论是启动或关闭)。

提示

  在“热键”框中可指定热键组合，以便将来使用此热键以调用本显示配色方案。

 相关主题


 显示器

保存显示配色方案

1	单击此处 [image] 查看“显示器属性”。

2	单击“显示器”标签。

3	单击“配色方案”框

4	输入显示配色方案的名称，然后单击“保存”。

此举便保存每个显示设备当前的配置(例如，不论是启动或关闭，设置到主要或次要的显示模式)。

提示

  在“热键”框中可指定热键组合，以便将来使用此热键以调用本显示配色方案。

 相关主题


 显示器

删除显示配色方案

1	单击此处 [image] 查看“显示器属性”。

2	单击“显示器”标签。

3	在“配色方案”区域内，单击所要删除配色方案。

4	单击“删除”。

 相关主题


 显示器

删除显示配色方案

1	单击此处 [image] 查看“显示器属性”。

2	单击“显示器”标签。

3	在“配色方案”区域内，单击所要删除的显示配色方案。

4	单击“删除”。

 相关主题


 显示器

调用显示配色方案

2	单击“显示器”标签。

3	在“配色方案”框内，单击所要调用的显示配色方案。

现在，各显示装置的设置便为选定的配色方案。

 相关主题


 显示器

调用显示配色方案

1	单击此处 [image] 查看“显示器属性”。

2	单击“显示器”标签。

3	在“配色方案”框内，单击所要调用的显示配色方案。

现在，各显示装置的设置便为选定的配色方案。

 相关主题


 显示器

为显示配色方案指定热键

1	单击此处 [image] 查看“显示器属性”。

2	单击“显示器”标签。

3	在“配色方案”框内，单击所要编辑热键的显示配色方案。

4	单击“热键”框。

5	键入按键组合以指定热键。

6	单击“保存”。

注意

  只能使用某些特定热键组合。

 相关主题


 显示器

为显示配色方案指定热键

1	单击此处 [image] 查看“显示器属性”。

2	单击“显示器”标签。

3	在“配色方案”框内，单击所要编辑热键的显示配色方案。

4	单击“热键”框。

5	键入按键组合以指定热键。

6	单击“保存”。

注意

  只能使用某些特定热键组合。

 相关主题


 显示器

启动/关闭显示装置

1	单击此处 [image] 查看“显示器属性”。

2	单击“显示器”标签。

3	单击开/关按钮 [image] 以启动/关闭显示装置。

当按钮在“启动”位置时，在相对应的显示装置上会出现桌面影像。

4	单击“确定”或“应用”以保存所做的更改。

注意

  必须启动显示装置，才能更改其显示属性。

  必须至少启动一部显示装置。

 相关主题


 显示器

更改显示装置的显示模式

1	单击此处 [image] 查看“显示器属性”。

2	单击“显示器”标签。

3	单击主要/次要显示装置的按钮以选取您想要更改的显示装置。

“主要”和“次要”按钮标签之间的切换以表示当前的显示模式。

必须先启动显示装置才能更改其显示模式。单击此处 以获取更详细信息。

4	单击“确定”或“应用”以保存所做的更改。

注意

  必须至少启动一部显示装置。

  必须至少设置一部显示装置为主要显示模式。

 相关主题


 显示器

更改显示装置的显示模式

1	单击此处 [image] 查看“显示器属性”。

2	单击“显示器”标签。

3	单击主要/次要显示装置的按钮以选取您想要更改的显示装置。

“主要”和“次要”按钮标签之间的切换以表示当前的显示模式。

必须先启动显示装置才能更改其显示模式。单击此处 以获取更详细信息。

4	单击“确定”或“应用”以保存所做的更改。

注意

  必须至少启动一部显示装置。

  必须至少设置一部显示装置为主要显示模式。

  您不可以设置平面显示器和电视皆为相同的显示模式。

 相关主题


图形加速器允许您在独特的显示模式中，含有独特的分辨率和刷新率，来显示屏幕上内容。


列出所有保存的桌面配色方案，以及一些预设配色方案。


显示“配色方案”清单中当前所选择热键。


单击此处保存每个显示设备的当前设置。所指定名称会出现在“配色方案”清单上，以便稍后可轻易还原显示设置。


删除在“配色方案”清单上选定的显示方案。


单击此处启动/关闭监视器显示。当这个按钮在“启动”位置时，桌面影像会出现在监视器图标上。快捷键 = Alt + 1


单击此处启动/关闭面板显示。当这个按钮在“启动”位置时，桌面影像会出现在面板图标上。快捷键 = Alt + 2


单击此处启动/关闭TV显示。当这个按钮在“启动”位置时，桌面影像会出现在TV图标上。快捷键 = Alt + 3


单击此处启动/关闭TV显示。当这个按钮在“启动”位置时，桌面影像会出现在TV图标上。快捷键 = Alt + 2


单击此处启动以下“监视器属性”页：

  监视器属性页

  监视器调整页

  监视器高级页


单击此处启动“平面面板属性”页。


单击此处启动以下的 TV 属性页：

  TV 属性页

  TV 调整页

  TV 高级页

  TV格式页


监视器图标显示，表明图形加速器可支持监视器。当监视器启动时，图标屏幕上便会出现一个桌面图象。


平面面板图标显示，表明图形加速器可支持平面面板。当平面面板启动时，图标屏幕上便会出现一个桌面图象。


TV图标显示，表明图形加速器可支持TV。当TV启动时，图标屏幕上便会出现一个桌面图象。


显示监视器当前分辨率和刷新频率。


显示平面面板当前分辨率和刷新频率。


显示TV当前分辨率和刷新频率。


单击此按钮将在主要和次要监视器显示模式之间切换(可用独特的分辨率和刷新频率)。快捷键 = Alt + 4


单击此按钮将在主要和次要平面面板显示模式之间切换(可用独特的分辨率和刷新频率)。快捷键 = Alt + 5

如需获取如何选取显示模式的更详细信息，单击显示标签上的帮助按钮即可。


单击此按钮将在主要和次要TV显示模式之间切换(可用独特的分辨率和刷新频率)。快捷键 = Alt + 6

如需获取如何选取显示模式的更详细信息，单击显示标签上的帮助按钮即可。


单击此按钮将在主要和次要TV显示模式之间切换(可用独特的分辨率和刷新频率)。快捷键 = Alt + 5

如需获取如何选取显示模式的更详细信息，单击显示标签上的帮助按钮即可。


本字段中每个项目均有帮助可用。单击 [image] 对话框上方，然后单击所要取得信息的特定项目。


保存显示配色方案
务要有一个以上显示器装置连接至图形加速器上，方能使用“配色方案”特性。


删除显示配色方案
务要有一个以上显示器装置连接至图形加速器上，方能使用“配色方案”特性。


调用显示配色方案
务要有一个以上显示器装置连接至图形加速器上，方能使用“配色方案”特性。


指派热键到显示配色方案
务要有一个以上显示器装置连接至图形加速器上，方能使用“配色方案”特性。


启动/关闭显示装置
务要有一个以上显示装置连接至图形加速器上，方能使用“配色方案”特性。


更改显示装置的显示模式
您的图形加速器不支持显示模式功能。


显示配色方案

显示配色方案保存每个显示装置的设置信息 (例如，是否启动/关闭显示装置)。


显示配色方案

显示配色方案保存每个显示装置的设置信息 [例如，是否启动/关闭显示装置，设置为主要或次要显示模式（例如，分辨率和刷新频率模式)]。


告诉我如何...

  选择监视器的最高分辨率

  选择监视器的最高刷新率

  返回快速入门窗口

  获取更详细信息


告诉我如何...

  调整监视器显示位置

  调整监视器显示大小

  返回快速入门窗口

  获取更详细信息


告诉我如何...

  调整监视器显示同步化

  返回快速入门窗口

  获取更详细信息


 设置

如果要安装新的显示器驱动程序

1	单击此处 [image] 在“设置”标签下查看“显示器属性”。

2	单击“显示器类型”按钮。

3	在“适配器类型”区域中，单击“更改”。

4	在“更改显示器”对话框中，单击“从磁片安装”。

5	欲从 CD-ROM 或从磁盘安装：

插入ATI安装 CD-ROM 或磁盘并键入以下内容：

D:\WINNT\ATIDRIVE（ D 是 CD-ROM 驱动器名或磁盘驱动器），
然后单击“确定”。

或者

欲安装从Internet下载的安装驱动程序

键入新驱动程序文件夹所在的完整路径（或使用“浏览”按钮到适当文件夹下浏览），然后单击“确定”。

6	选取与您的硬件相配的显示器适配器；然后单击“确定”。

7	单击“是”以制作驱动程序档的安装。

新的显示器驱动程序文件会复制到您的计算机中。

8	单击“是”以关闭安装驱动程序对话框。

9	单击“关闭”以退出“显示器类型”对话框。

10	若需要有关如何选定与硬件相匹配监视器的帮助，单击此处 [image] 。否则，请到下一步(11)。

11	单击“应用”以保存更改并退出“显示器内容”对话框，然后单击“是”来重新启动 Windows。

注意

  重设之后，“ATI桌面帮助”会带领熟悉新ATI图形加速器产品的增强性能。


更改显示器驱动程序
 设置

更改显示器驱动程序

1	单击此处 [image] 查看“显示器属性”的“设置”标签。

2	单击“显示器类型”按钮。

3	在“适配器类型”区域中，单击“更改”。

4	在“更改显示器”对话框中，单击“从磁片安装”。

5	欲从 CD-ROM 或从磁盘安装：

插入安装 CD-ROM 或磁盘并键入以下内容：

D:\WINNT\ATIDRIVE（D 是 CD-ROM 驱动器名或磁盘驱动器），
然后单击“确定”。

或者

欲安装从Internet下载的安装驱动程序

键入新驱动程序文件夹所在的完整路径（或使用“浏览”按钮到适当文件夹下浏览），然后单击“确定”。

6	选取与您的硬件相配的显示器适配器；然后单击“确定”。

7	单击“是”以制作驱动程序档的安装。

新的显示器驱动程序文件会复制到您的计算机中。

8	单击“是”以关闭安装驱动程序对话框。

9	单击“关闭”以退出“显示器类型”对话框。

10	单击“关闭”以保存更改并退出“显示器内容”对话框，然后单击“是”来重新启动 Windows。

 相关主题


 设置

要设置监视器属性

1	单击这里 [image] 查看“显示器内容”的“设置值”标签。

2	在“刷新频率”框中，为您的监视器选取最佳化的刷新频率。

3	单击“属性”标签。

4	如果您的监视器有显示数据频道，单击“使用DDC 信息”按钮。否则，请到下一步。

5	在“最高分辨率”和“最高刷新速率”框中，选取您所喜爱的最高分辨率和最高刷新速率设置值。

6	单击“确定”。

7	单击“关闭”来结束“显示器内容”。

8	单击“是”来重新启动 Windows。

注意

  重设之后，“桌面帮助”会带领您完成一些新图形加速器产品的加强功能。


 设置

要设置监视器属性

1	单击这里 [image] 查看“显示器内容”的“设置值”标签。

2	在“刷新频率”框，为您的监视器选取最佳化的刷新频率。

3	单击“显示器”标签。

4	单击“监视器”按钮。

您一定要先启动监视器才能更改其显示器内容。单击这里 以获取详细的信息。

5	单击“属性”标签。

6	如果您的监视器有显示数据频道，单击“使用DDC 信息”按钮。否则，请到下一步骤(7)。

7	在“最高分辨率”和“最高刷新速率”框中，选取您所喜爱的最高分辨率和最高刷新速率设置值。

8	单击“确定”。

9	单击“关闭”来结束“显示器内容”。

10	单击“是”来重新启动 Windows。

注意

  重设之后，“桌面帮助”会带领您完成一些新图形加速器产品的加强功能。


要设置监视器属性
 设置值

要设置监视器属性

1	单击这里 [image] 查看“显示器内容”的“设置值”标签。

2	在“刷新频率”框中，为您的监视器选取最佳化的刷新频率。

3	单击“属性”标签。

4	如果您的监视器有显示数据频道，单击“使用DDC 信息”按钮。否则，请到下一步。

5	在“最高分辨率”和“最高刷新速率”框中，选取您所喜爱的最高分辨率和最高刷新速率设置值。

6	单击“确定”。

7	单击“关闭”来结束“显示器内容”。

8	单击“是”来重新启动 Windows。

 相关主题


 设置值

要设置监视器属性

1	单击这里 [image] 查看“显示器内容”的“设置值”标签。

2	在“刷新频率”框，为您的监视器选取最佳化的刷新频率。

3	单击“显示器”标签。

4	单击“监视器”按钮。

您一定要先启动监视器才能更改其显示器内容。单击这里 以获取详细的信息。

5	单击“属性”标签。

6	如果您的监视器有显示数据频道，单击“使用DDC 信息”按钮。否则，请到下一步骤(7)。

7	在“最高分辨率”和“最高刷新速率”框中，选取您所喜爱的最高分辨率和最高刷新速率设置值。

8	单击“确定”。

9	单击“关闭”来结束“显示器内容”。

10	单击“是”来重新启动 Windows。

 相关主题


要调整监视器的最高刷新速率
 监视器属性

要调整监视器的最高刷新速率

1	单击这里 [image] 来查看“显示器内容”。

2	单击“属性”标签。

3	如果您的监视器有显示数据频道，单击“使用DDC 信息”按钮。否则，请到下一步。

4	在“最高分辨率”框中，选取您所喜爱的最高分辨率设置值。

5	单击“确定”或“套用”来保存您所做的更改。

警告

调整最高刷新速率前请先参考监视器的用户手册。套用错误的最高刷新速率可以导致监视器的严重损害。

 相关主题


 监视器属性

要调整监视器的最高刷新速率

1	单击这里 [image] 来查看“显示器内容”。

2	单击“显示器”标签。

3	单击“监视器”按钮。

您一定要先启动监视器才能更改其显示器内容。单击这里 以获取详细的信息。

4	单击“属性”标签。

5	如果您的监视器有显示数据频道，单击“使用DDC 信息”按钮。否则，请到下一步。

6	在“最高分辨率”框中，选取您所喜爱的最高分辨率设置值。

7	单击“确定”或“套用”来保存您所做的更改。

注意

  如果您同时启动监视器和电视，两者的刷新速率将一致，并受到较低刷新速率的限制。

警告

调整最高刷新速率前请先参考监视器的用户手册。套用错误的最高刷新速率可以导致监视器的严重损害。

 相关主题


监视器属性

要调整监视器的最高刷新速率

1	单击这里 [image] 来查看“显示器内容”。

2	单击“显示器”标签。

3	单击“监视器”按钮。

您一定要先启动监视器才能更改其显示器内容。单击这里 以获取详细的信息。

4	单击“属性”标签。

5	如果您的监视器有显示数据频道，单击“使用DDC 信息”按钮。否则，请到下一步。

6	在“最高分辨率”框中，选取您所喜爱的最高分辨率设置值。

7	单击“确定”或“套用”来保存您所做的更改。

注意

  如果监视器和电视同时设置成相同的显示模式，两者的刷新速率将一致，并受到较低刷新速率的限制。单击这里 以获取如何更改显示模式的信息。

警告

调整最高刷新速率前请先参考监视器的用户手册。套用错误的最高刷新速率可以导致监视器的严重损害。

 相关主题


要调整监视器的最高分辨率
 监视器属性

要调整监视器的最高分辨率

1	单击这里 [image] 来查看“显示器内容”。

2	单击“属性”标签。

3	如果您的监视器有显示数据频道，单击“使用DDC 信息”按钮来完成此过程。否则，请到下一步。

4	在“最高分辨率”框中，选取您所喜爱的最高分辨率设置值。

5	单击“确定”或“套用”来保存您所做的更改。

注意

  如果设置值页面上的桌面区域(分辨率)超过您选取的最高分辨率数值，您的监视器会自动地进入平移模式。

 相关主题


监视器属性

要调整监视器的最高分辨率

1	单击这里 [image] 来查看“显示器内容”。

2	单击“显示器”标签。

3	单击“监视器”按钮。

您一定要先启动监视器才能更改其显示器内容。单击这里 以获取详细的信息。

4	单击“属性”标签。

5	如果您的监视器有显示数据频道，单击“使用DDC 信息”按钮来完成此过程。否则，请到下一步。

6	在“最高分辨率”框中，选取您所喜爱的最高分辨率设置值。

7	单击“确定”或“套用”来保存您所做的更改。

注意

  如果监视器和电视同时启动，设置值页面上的桌面区域(分辨率)超过您选取的最高分辨率数值，两者会自动地进入平移模式。

 相关主题


监视器属性

要调整监视器的最高分辨率

1	单击这里 [image] 来查看“显示器内容”。

2	单击“显示器”标签。

3	单击“监视器”按钮。

您一定要先启动监视器才能更改其显示器内容。单击这里 以获取详细的信息。

4	单击“属性”标签。

5	如果您的监视器有显示数据频道，单击“使用DDC 信息”按钮来完成此过程。否则，请到下一步。

6	在“最高分辨率”框中，选取您所喜爱的最高分辨率设置值。

7	单击“确定”或“套用”来保存您所做的更改。

注意

  如果监视器和电视同时设置成不同的显示模式，平移模式会自动地回到各显示器分辨率并低于设置值页面上的桌面区域(分辨率)。

 相关主题


调整监视器屏幕位置
 监视器调整

调整监视器屏幕位置

1	单击此处 [image] 查看“显示器属性”。

2	单击“调整”标签。

3	单击“屏幕位置”区域中四个位置方向箭其中之一，更改屏幕位置。

此四个方向箭会将显示器屏幕左右上下移动。

4	单击“确定”或“套用”来保存您所做的更改。

 相关主题


 监视器调整

调整监视器屏幕位置

1	单击此处 [image] 查看“显示器属性”。

2	单击“显示器”标签。

3	单击“监视器”按钮。

您一定要先启动监视器才能更改其显示器内容。单击这里 以获取详细的信息。

4	单击“调整”标签。

5	单击“屏幕位置”区域中四个位置方向箭其中之一，更改屏幕位置。

此四个方向箭会将显示器屏幕左右上下移动。

6	单击“确定”或“套用”来保存您所做的更改。

 相关主题


调整监视器屏幕大小
 监视器调整

调整监视器屏幕大小

1	单击此处 [image] 查看“显示器属性”。

2	单击“调整”标签。

3	单击“垂直/水平屏幕”区域内的 (+) 和 (-) 按钮来更改您的屏幕大小。

“垂直屏幕”下的 (+) 和 (-) 按钮会增加/缩小监视器显示的垂直大小。

“水平屏幕”下的 (+) 和 (-) 按钮会增加/缩小监视器显示的水平大小。

4	单击“确定”或“套用”来保存您所做的更改。

 相关主题


 监视器调整

调整监视器屏幕大小

1	单击此处 [image] 查看“显示器属性”的“设置”标签。

2	单击“显示器”标签。

3	单击“监视器”按钮。

您一定要先启动监视器才能更改其显示器内容。单击这里 以获取详细的信息。

4	单击“调整”标签。

5	单击“垂直/水平屏幕”区域内的 (+) 和 (-) 按钮来更改您的屏幕大小。

“垂直屏幕”下的 (+) 和 (-) 按钮会增加/缩小监视器显示的垂直大小。

“水平屏幕”下的 (+) 和 (-) 按钮会增加/缩小监视器显示的水平大小。

6	单击“确定”或“套用”来保存您所做的更改。

注意

  如果监视器和电视同时启用则大小控制将不可用。

 相关主题


 监视器调整

调整监视器屏幕大小

1	单击此处 [image] 查看“显示器属性”的“设置”标签。

2	单击“显示器”标签。

3	单击“监视器”按钮。

您一定要先启动监视器才能更改其显示器内容。单击这里 以获取详细的信息。

4	单击“调整”标签。

5	单击“垂直/水平屏幕”区域内的 (+) 和 (-) 按钮来更改您的屏幕大小。

“垂直屏幕”下的 (+) 和 (-) 按钮会增加/缩小监视器显示的垂直大小。

“水平屏幕”下的 (+) 和 (-) 按钮会增加/缩小监视器显示的水平大小。

6	单击“确定”或“套用”来保存您所做的更改。

注意

  如果监视器和电视同时设置成相同的显示模式，大小控制便不供使用。单击此处 以获取如何更改显示模式的信息。

 相关主题


调整监视器同步化
 监视器高级

调整监视器同步化

1	单击此处 [image] 查看“显示器属性”。

2	单击“高级”标签。

3	在“同步化”方块中，单击“水平”或“垂直”按钮来调整同步化

按钮标签会在(+)和(-)之间切换，来表示。

4	单击“确定”或“套用”来保存您所做的更改。

 相关主题


 监视器高级

调整监视器同步化

1	单击此处 [image] 查看“显示器属性”。

2	单击“显示器”标签。

3	单击“监视器”按钮。

您一定要先启动监视器才能更改其显示器内容。单击这里 以获取详细的信息。

4	单击“高级”标签。

5	在“同步化”方块中，单击“水平”或“垂直”按钮以调整同步化。

6	单击“确定”或“套用”来保存您所做的更改。

 相关主题


将监视器屏幕大小和位置重设为默认值
 监视器调整

将监视器屏幕大小和位置重设为默认值

1	单击此处 [image] 查看“显示器属性”。

2	单击“调整”标签。

3	单击“默认值”按钮。

4	单击“确定”或“套用”来保存您所做的更改。

 相关主题


 监视器调整

将监视器屏幕大小和位置重设为默认值

1	单击此处 [image] 查看“显示器属性”的“设置”标签。

2	单击“显示器”标签。

3	单击“监视器”按钮。

您一定要先启动监视器才能更改其显示器内容。单击这里 以获取详细的信息。

4	单击“调整”标签。

5	单击“默认值”按钮。

6	单击“确定”或“套用”来保存您所做的更改。

 相关主题


将监视器屏幕同步化重设为默认值
 监视器高级

将监视器屏幕同步化重设为默认值

1	单击此处 [image] 查看“显示器属性”。

2	单击“高级”标签。

3	单击“默认值”按钮。

4	单击“确定”或“套用”来保存您所做的更改。

 相关主题


 监视器高级

将监视器屏幕同步化重设为默认值

1	单击此处 [image] 查看“显示器属性”。

2	单击“显示器”标签。

3	单击“监视器”按钮。

您一定要先启动监视器才能更改其显示器内容。单击此处 以获取详细的信息。

4	单击“高级”标签。

5	单击“默认值”按钮。

6	单击“确定”或“套用”来保存您所做的更改。

 相关主题


要将监视器的最高屏幕分辨率和刷新速率重设成默认值
监视器属性

要将监视器的最高屏幕分辨率和刷新速率重设成默认值

1	单击此处 [image] 查看“显示器属性”。

2	单击“监视器”标签。

3	单击“默认值”按钮。

4	单击“确定”或“套用”来保存您所做的更改。

 相关主题


监视器属性

要将监视器的最高屏幕分辨率和刷新速率重设成默认值

1	单击此处 [image] 查看“显示器属性”。

2	单击“显示器”标签。

3	单击“监视器”按钮。

您一定要先启动监视器才能更改其显示器内容。单击这里 以获取详细的信息。

4	单击“监视器”标签。

5	单击“默认值”按钮。

6	单击“确定”或“套用”来保存您所做的更改。

 相关主题


 疑难解答

  疑难解答提示

  疑难解答常见问题（FAQs）

  问题报告向导

  技术支持


疑难解答提示
 疑难解答

疑难解答提示

计算机显示器的问题可以因数种不同问题的组合造成。您可以检查以下所列的事项来帮助您判断问题所在。

问题出在哪里？

无法选择喜爱的色彩/屏幕分辨率。

显示器的驱动程序作业不正确。


无法安装显示器驱动程序
 疑难解答

如果您的显示器驱动程序的作业不正确

  使用以下的步骤，安装随附在 Windows NT 安装磁盘中的标准驱动程序：

1	单击此处 [image] 查看“显示器内容”。

2	单击“设置值”标签。

3	单击“显示器类型”。

4	在“适配器类型”区域中，单击“更改”。

5	在“制造厂商”的清单中，选取“ATI Technologies�。

6	在“显示器”清单中，选择符合您的 ATI 图形加速器产品显示器驱动程序。

7	单击“确定”，然后单击“关闭”。

8	单击“套用”来保存所做的更改，然后单击“是”来重新启动 Windows。


无法设置显示器色彩
 疑难解答

无法设置喜爱的显示器色彩/分辨率

  “设置值”页上可供使用的色彩深度和屏幕分辨率组合要视安装的 ATI 图形加速器的功能而定。

  视选取的显示器装置��图形加速器组态而定，BIOS 很可能会被通知此组合不供使用。


接洽 ATI客户支持
 技术支持

请洽您的经销商以取得技术支持。


 常见的问题

哪里可以取得新的 ATI 驱动程序？

 如何更改显示器驱动程序？

“ATI 工作列”图示有什么功能？


新的 ATI 驱动程序
哪里可以取得新的 ATI 驱动程序？

请洽经销商获取新的 ATI 增强驱动程序。


显示监视器支持的最高分辨率和刷新速率。


显示监视器可用的最高分辨率数值。


显示监视器可用的最高刷新速率数值。

警告

调整最高刷新速率前请先参考监视器的用户手册。套用错误的最高刷新速率可以导致监视器的严重损害。


如果您的监视器设有显示数据频道DDC (DDC)，单击此按钮 -- 提供新式监视器用来与其属性相关之视频适配器沟通的资料频道(例如最高分辨率刷新速率)。


显示图标以描述监视器显示的大小和位置。


确定监视器显示的位置。

  “屏幕位置”下四个方向箭会将显示器屏幕左右上下移动。

  快捷键：Alt 键与 J，K，I，或 M 的组合。


调整监视器显示的大小。

  “垂直屏幕大小”下（+）和（-）按钮会增加/减小监视器的垂直大小。快捷键：Alt 键与 = (等号) 或 - (减号)的组合。

  “水平屏幕大小”下（+）和（-）按钮会增加/减小显示器的水平大小。快捷键：Alt 键与 ] 或 [ 的组合。


单击此按钮以将监视器屏幕大小和位置重设为默认值.


调整监视器的“水平”、“垂直”及“复合”同步化。请参考监视器规格以获取推荐设置。

  单击“水平”或“垂直”按钮可调整同步化。

  单击“复合”按钮可切换复合同步开关。


单击此按钮可切换水平同步化。


单击此按钮可切换垂直同步化。


在此处作标选，即组合了由 ATI 图形卡向监视器提供的水平和垂直同步信号。

警告

  仅当您在使用复合同步监视器时，才应选取复合同步。关于您所使用的监视器其类型，请参考监视器用户手册中的信息。


单击此按钮以将监视器同步化重设为默认值。


屏幕分辨率

屏幕分辨率”是显示于屏幕上的象素数目，以WxH 数字形式显示。在此，W 是平行（宽度）显示的象素数目， H 是垂直（高度）显示的象素数目。典型的屏幕分辨率包括 640x480、800x600、1024x768、1152x864 及 1280x1024.


象素

一个象素是显示器上之一‘点’。每一象素均可为不同颜色。可用颜色数目由每个与象素（Pixel）有关的位数决定，这些位数代表该象素的颜色。此颜色深度可指定为 bpp （每单位象素的位数）设置。一些常见值有：

  8 bpp - 提供 256色

  16 bpp - 提供 65K色

  32 bpp - 提供 16.7M色。


显示数据频道

较新监视器所使用的数据频道，用于其各种属性（例如，最大分辨率和刷新率）与相关视频适配器之间的通讯。此举可在用户设置显示器时帮助系统提供有效的选项。


您的图形加速卡允许您在独特显示模式中，以独特分辨率和刷新率显示屏幕上内容。


核取此处可从质量上优化 OpenGL 设置。您可通过调整“OpenGL 设置”的控制，作进一步细调。


核取此处可从性能上优化 OpenGL 设置。您可通过调整“OpenGL 设置”的控制，作进一步细调。


核取此处可提高那些大量使用纹理的游戏的性能，但可能同时会降低图像质量。


核取此处可对屏幕上已被移动的部分启用快速更新功能。


核取此处可删除某些屏幕假象。这些假象有时会在同时启用抖动和阿尔法混合时产生。


核取此处会降低全屏幕游戏的每秒帧速率，但同时也减少在较高帧速率下会出现的图像破裂情况。


核取此处将启用页面翻转的硬件加速功能以交换全屏幕缓冲区。


为子象素选择较高值可获得较高的图像准确性，但同时也会使性能轻微降低。


建议将“清晰”设置用于较大的、详细的、立体映射 (mipmapped) 的画面。

建议将“模糊”设置用于较小的、粗略的、立体映射 (mipmapped) 的画面。


核取此处会降低全屏幕游戏的每秒帧速率，但同时也减少在较高帧速率下会出现的图像破裂情况。


核取此处可提供平滑的对象边缘，但同时也会使性能有所降低。


核取此处会降低性能。只有当正在运行的游戏不能使用其它纹理格式时，您才应当激活此特性。


建议将此特性设置为 32。只有当应用程序采用此设置有问题时，您才应当选择一个较低值。


选中此项以启用ATI任务栏图标。


使用该特性旋转您的区域。

  将滑杆拖至 �90 位置以便逆时针旋转您的显示区域。

 将滑杆拖至 +90 位置以便顺时针旋转您的显示区域。

单击“确定”或“应用”保存您所做的更改。


核取此处以便使放映机解决方案列表生效；然后从该列表中选取适当设置，再单击“应用”。


请从该列表中选取适合您的放映机的解决方案，然后单击“应用”。


新显示器属性页
 显示器属性

以下显示器属性页已作新增或修改以支持新增强显示器驱动程序的实用程序：

  颜色页 - 用于修正真实颜色值和监视器显示颜色方式之间的色调差异。

  属性页 - 用于设置监视器的属性，例如像最高的分辨率和最高的重新整理速率，并能用于启动 DDC 的监视器通讯。

  高级页 - 用于调整监视器图象大小和位置。

  调整页 - 用于调整监视器水平及垂直同步化的控制。


 显示器属性

以下显示器属性页已作添加或修改，以支持新增强显示器驱动程序的实用程序：

  颜色页 - 用于修正真实颜色值及监视器或平面面板显示颜色方式之间的色调差异。

  显示器页 - 用于启动/关闭显示器装置、启动各种与显示器装置相关的属性页、以及保存各种显示配色方式以便将来调用。

  与显示器相关属性页- 对显示器装置作高级调整 - 例如，调整监视器显示大小和位置。

注意

  “与显示器相关属性”页可通过“显示器”页访问。


 ATI 任务栏图标

ATI 的捷径图标可以提供各种程序、显示器设置值、以及“ATI 桌面”联机帮助系统的立即访问。

如果您将光标放置到 ATI 图标上，您就可以查看以下的设置值：

  屏幕分辨率

  桌面大小

  色彩深度

如果您在 ATI 图标上单击鼠标右键的话，会有一个含以下五个选项的菜单出现：

 ATI 程序�从同一个位置开启所有安装的 ATI 程序

 配色方式�选取一个以前保存的显示器配色方式

 设置�开启 ATI 图标设置值、显示器设置值、以及装置设置值

 帮助�启动“ATI 桌面”帮助系统

 疑难解答�启动疑难解答说明的作业阶段

提示

  您也可以在这个图标上连续双击鼠标左键来直接启动“ATI 桌面”帮助。


 桌面

Windows 桌面已配有“智能查看”。该性能会尝试为每个设置在特定显示模式(例如，分辨率和刷新率)上的显示器装置设置最佳显示区域。“智能查看”优点包括：

  根据源图象大小的更改自动调整桌面区域大小。

  尽可能显示整个桌面区域。

  根据显示器装置限制的要求随时自动进出全景模式。

  桌面大小超过该装置最高分辨率时，显示器装置不需关闭。


在“ATI 任务栏”菜单中，单击您想要的图标类型。


在“菜单”方块中核取“边缘视频”，将 ATI Technologies 图形显示在菜单上。


显示器属性

使用“显示器属性”对话框可在 Windows 中自定义各种屏幕组成元素。欲访问此对话框，请在桌面空白区域单击鼠标右按钮，然后单击“属性”。


设备管理

经由系统属性对话框可访问“设备管理”标签。设备管理为计算机提供一份硬件分类清单（包括显示器适配器），藉此可查看或更改特定装置驱动程序，或修改其配置。


装置驱动程序

此为直接处理特定计算机装置硬件的最低级别软件（如鼠标器、键盘、图形加速器等）。


系统属性

使用“系统属性”对话框可查看或修改系统配置设置，包括图形加速器硬件配置（通过设备管理）。欲显示“系统属性”，请双击“控制面板”上“系统” 图标。